{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"CODIGO","type":"number","width":5,"decimals":0},{"name":"COD_CPT","type":"character","width":5},{"name":"DESC_CPT","type":"character","width":254},{"name":"SEXO","type":"character","width":1},{"name":"MIN_EDAD","type":"number","width":2,"decimals":0},{"name":"MIN_TIPO","type":"character","width":1},{"name":"MAX_EDAD","type":"number","width":2,"decimals":0},{"name":"MAX_TIPO","type":"character","width":1},{"name":"CLASE","type":"character","width":1},{"name":"EST","type":"character","width":1}],"n_rows":1351,"rows_kept":1351,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[1,"10060","Incision y drenaje",null,1,"D",99,"A","4","A"]
[2,"10120","Extraccion de Cuerpo Extrano",null,1,"D",99,"A","4","A"]
[3,"10781","Canalizacion de Via Periferica",null,1,"D",99,"A","4","A"]
[4,"11100","Biopsia de piel, tejido subcutaneo y/o mucosa, lesion unica",null,1,"D",99,"A","4","A"]
[5,"11400","Exeresis de Lesion Benigna",null,1,"D",99,"A","4","A"]
[6,"11443","Extraccion de Quistes Menores",null,1,"D",99,"A","4","A"]
[7,"11750","Extraccion de Una",null,1,"D",99,"A","4","A"]
[8,"12002","Correccion simple de heridas superficiales",null,1,"D",99,"A","4","A"]
[9,"19100","Biopsia de mama. Aguja Trocar","F",10,"A",52,"A","4","A"]
[10,"19101","Toma de Biopsia de Mama","F",10,"A",52,"A","4","A"]
[11,"19160","Cuadrantectomia de Mama (Mastectomia Parcial)","F",10,"A",52,"A","4","A"]
[12,"19180","Mastectomia Simple Completa","F",10,"A",52,"A","4","A"]
[13,"19200","Mastectomia Radical","F",10,"A",52,"A","4","A"]
[14,"31500","Intubacion Endotraqueal",null,1,"D",28,"D","4","A"]
[15,"53670","Catetizacion Uretral Simple (Cambio de Sonda/Sondaje Vesical)","M",1,"D",99,"A","4","A"]
[16,"57452","Colposcopia","F",10,"A",99,"A","4","A"]
[17,"57460","Colposcopia con Electrocirugia (Leep)","F",10,"A",99,"A","4","A"]
[18,"57500","Toma de Biopsia de Cervix","F",10,"A",99,"A","4","A"]
[19,"57511","Crioterapia",null,1,"M",99,"A","4","A"]
[20,"57520","Conizacion del cervix","F",10,"A",99,"A","4","A"]
[21,"57522","Electrocirugia (Leep)","F",10,"A",99,"A","4","A"]
[22,"58200","Histerectomia Ampliada a Vagina","F",10,"A",0,null,"4","A"]
[23,"58210","Histerectomia Radical","F",20,"A",99,"A","4","I"]
[24,"59400","Atencion del Parto de Alto Riesgo","F",10,"A",49,"A","4","A"]
[25,"59430","Control de puerperio","F",10,"A",49,"A","4","A"]
[27,"69210","Lavado de Oido",null,1,"D",99,"A","4","A"]
[28,"90799","Canalizacion de Via Central",null,1,"D",99,"A","4","A"]
[29,"91105","Intubacion gastrica, lavado o aspiracion terapeutica",null,1,"D",99,"A","4","A"]
[30,"93000","Electrocardiograma",null,1,"D",99,"A","4","A"]
[31,"94664","Nebulizacion",null,1,"D",99,"A","4","A"]
[32,"96100","Consulta Psicologica (UPA)",null,1,"D",99,"A","4","A"]
[33,"99058","Evolucion de Emergencia",null,1,"D",99,"A","4","A"]
[34,"99202","Consulta",null,1,"D",99,"A","4","I"]
[35,"99285","Atencion de Emergencia, Prioridad IV",null,1,"D",99,"A","4","A"]
[36,"31622","Broncoscopia",null,1,"D",99,"A","4","A"]
[37,"44388","Colonoscopia a Traves del Estoma; Diagnostica, con o sin Recoleccion de Especimenes Mediantecepillado o Lavado (Procedimiento Separado)",null,1,"D",99,"A","4","A"]
[38,"45300","Proctosigmoidoscopia",null,1,"D",99,"A","4","A"]
[39,"45355","Colonoscopia, Rigida o Flexible, Transabdominal Via Colotomia, Una o Varias",null,1,"D",99,"A","4","I"]
[40,"45378","Colonoscopia diagnostica, flexible",null,1,"D",99,"A","4","A"]
[41,"57510","Cauterizacion del Cervix; Electro o Termica","F",7,"A",99,"A","4","A"]
[42,"67800","Excision de Chalazion; uno solo",null,1,"D",99,"A","4","A"]
[43,"76536","Ultrasonido de tejidos blandos de cabeza y cuello",null,1,"D",99,"A","4","A"]
[44,"76604","Ultrasonido de torax",null,1,"D",99,"A","4","A"]
[45,"76645","Ecografia Mamaria",null,1,"D",99,"A","4","A"]
[46,"76700","Ecografia Abdominal completa",null,1,"D",99,"A","4","A"]
[47,"76770","Ecografia renal",null,1,"D",99,"A","4","A"]
[48,"76778","Ecografia de Rinon Transplantado, Rastreo B y/o en Tiempo Real con Documentacion de la Imagen, con Osin Estudios Doppler D?plex",null,1,"D",99,"A","4","A"]
[49,"76800","Ecografia, Canal Espinal y Contenido",null,1,"D",99,"A","4","A"]
[50,"76805","Ecografia, Utero Gravido, Rastreo B y/o en Tiempo Real con Documentacion de la Imagen; Completa (Evaluacion Fetal y Materna Completa)","F",10,"A",60,"A","4","A"]
[51,"76830","Ecografia transvaginal obstetrica","F",10,"A",75,"A","4","A"]
[52,"76856","Ultrasonido pelvico (no obstetrico)",null,1,"D",99,"A","4","A"]
[53,"76870","Ecografia, Escroto y Contenido","M",1,"D",99,"A","4","A"]
[54,"76872","Ultrasonido prostatico transrectal","M",10,"A",99,"A","4","A"]
[55,"76880","Ecografia, Extremidades, No Vascular, Rastreo B y/o en Tiempo Real con Documentacion de la Imagen",null,1,"D",99,"A","4","A"]
[56,"76885","Ultrasonido de caderas de lactante",null,1,"D",99,"A","4","A"]
[57,"76950","Ecografia para la Colocacion de Campos de Terapia de Radiacion, Rastreo B",null,1,"D",99,"A","4","A"]
[58,"76986","Ecografia Intraquirurgica",null,1,"D",99,"A","4","A"]
[59,"92100","Determinacion de la presion intraocular bilateral",null,1,"D",99,"A","4","A"]
[60,"92120","Tonografia con Interpretacion E Informe, Metodo de Tonometro de Registro de Indentacion o Mötodo Desuccion Perilimbica",null,1,"D",99,"A","4","A"]
[61,"92130","Tonografia con Provocacion por Agua",null,1,"D",99,"A","4","A"]
[62,"92552","Audiometria de Tonos Puros (Umbral); Transmitidos Por Aire Solamente",null,1,"D",99,"A","4","A"]
[63,"92560","Audiometria de Bekesy; Evaluacion",null,1,"D",99,"A","4","A"]
[64,"92579","Audiometria de Refuerzo Visual (VRA)",null,1,"D",99,"A","4","A"]
[65,"92582","Audiometria de Condicionamiento por Juego",null,1,"D",99,"A","4","A"]
[66,"92583","Audiometria de Cuadro Seleccionado",null,1,"D",99,"A","4","A"]
[67,"93015","Prueba de Esfuerzo",null,1,"D",99,"A","4","A"]
[68,"94010","Espirometria",null,1,"D",99,"A","4","A"]
[69,"94620","Prueba de Esfuerzo Pulmonar; Sencilla (P. Ej. Prueba de Ejercicio Prolongado para Broncoespasmo con Pre y Post Espirometria)",null,1,"D",99,"A","4","A"]
[70,"95812","Electroencefalograma",null,1,"D",99,"A","4","A"]
[71,"95813","Electroencefalograma (EEG), Control Prolongado; Mas de Una Hora",null,1,"D",99,"A","4","A"]
[72,"95816","Electroencefalograma (EEG), Incluyendo el Registro en Estado de Vigilia y en Estado de Somnolencia (Incluye Hiperventilacion y/o Estimulacion Fotica Cuando Sea",null,1,"D",99,"A","4","A"]
[73,"95819","Electroencefalograma (EEG), Incluyendo el Registro en Estado de Vigilia y en Estado de Sueno, (Incluye Hiperventilacion y/o Estimulacion Fotica Cuando Sea Aprop",null,1,"D",99,"A","4","A"]
[74,"95822","Electroencefalograma (EEG), Durante el Sueno Solamente",null,1,"D",99,"A","4","A"]
[75,"95824","Electroencefalograma (EEG), Evaluacion de Muerte Cerebral Solamente",null,1,"D",99,"A","4","A"]
[76,"95827","Electroencefalograma (EEG), Sueno de Toda la Noche Solamente",null,1,"D",99,"A","4","A"]
[77,"97780","Acupuntura, Una o Mas Agujas; sin Estimulacion Electrica",null,1,"D",99,"A","4","A"]
[78,"92015","Refraccion",null,1,"D",99,"A","4","A"]
[79,"44360","Endoscopia del Intestino Delgado, Enteroscopia Mas Alla de la Segunda Porcion del Duodeno, Sinincluir el Ileon; Diagnostica, con o sin Recoleccion de Especimene",null,1,"D",99,"A","4","A"]
[80,"44361","Biopsia de lesion de intestino delgado",null,1,"D",99,"A","4","A"]
[81,"44363","Endoscopia del Intestino Delg., Enteroscopia Mas Alla de la Segunda Porc. del Duodeno, sin Incluir el Ileon;C/Extirpacion de Cuerpo Ext.",null,1,"D",99,"A","4","A"]
[82,"44364","Endoscopia del Intestino Delgado, Enteroscopia Mas Alla de la Segunda Porcion del Duodeno, sin Incluir el Ileon; con Extirpacion de Tumores, Polipos, U Otra Les",null,1,"D",99,"A","4","A"]
[83,"44365","Endoscopia del Intestino Delgado, Enteroscopia Mas Alla de la Segunda Porcion del Duodeno, sin Incluir el Ileon; con Extirpacion de Tumores, Polipos, U Otra Les",null,1,"D",99,"A","4","A"]
[84,"44366","Endoscopia del Intest. Delg., Enteroscopia Mas Alla de la Seg. Porc. del Duodeno,S/Incluir el Ileon; C/ Cont. de Sangrado, Cualquier Möt.",null,1,"D",99,"A","4","A"]
[85,"44369","Endoscopia del Intestino Delg., Enteroscopia Mas Alla de la Segunda Porc. del Duodeno, sin Incluir el Ileon; con Ablacion de Tumores, Polipos, U Otra Les. No Fa",null,1,"D",99,"A","4","A"]
[86,"44372","Endoscopia del Intestino Delgado, Enteroscopia Mas Alla de la Segunda Porcion del Duodeno, sin Incluir el Ileon; con Colocacion de Tubo Percutaneo de Yeyunostom",null,1,"D",99,"A","4","A"]
[87,"44373","Endoscopia del Intestino Delgado, Enteroscopia Mas Alla de la Segunda Porcion del Duodeno, sin Incluir el Ileon; con Conversion de Tubo Percutaneo de Gastrostom",null,1,"D",99,"A","4","A"]
[88,"44376","Endoscopia del Intestino Delgado, Enteroscopia Mas Alla de la Segunda Porcion del Duodeno, Incluyendo Ileon; Diagnostica, con o sin Recoleccion de Especimenes M",null,1,"D",99,"A","4","A"]
[89,"44377","Endoscopia del Intestino Delgado, Enteroscopia Mas Alla de la Segunda Porcion del Duodeno, Incluyendo Ileon; con Biopsia, \u009dnica o M?ltiple",null,1,"D",99,"A","4","A"]
[90,"44378","Endoscopia del Intestino Delgado, Enteroscopia Mas Alla de la Segunda Porcion del Duodeno, Incluyendo Ileon; con Control de Sangrado, Cualquier Mötodo",null,1,"D",99,"A","4","A"]
[91,"32002","Toracentesis",null,1,"D",99,"A","4","A"]
[92,"55700","Biopsia, Prostata; con Aguja o en Sacabocado, Una Sola o Varias, Cualquier Abordaje","M",10,"A",99,"A","4","A"]
[93,"55705","Biopsia, Prostata; Incisional, Cualquier Abordaje","M",10,"A",99,"A","4","A"]
[94,"56351","Histeroscopia, Quirurgica; con Toma de Muestra (Biopsia) de Endometrio y/o Polipectomia, con o sin D y L (Dilatacion y Legrado)","F",20,"A",99,"A","4","I"]
[95,"30100","Biopsia, Intranasal",null,1,"D",99,"A","4","A"]
[96,"30801","Cauterizacion y/o Ablacion, Mucosa de Cornete Nasal, Unilateral o Bilateral, Cualquier Metodo,",null,1,"D",99,"A","4","A"]
[97,"31505","Laringoscopia, Indirecta (Procedimiento Separado); Diagnostico",null,1,"D",99,"A","4","A"]
[98,"31510","Laringoscopia, Indirecta (Procedimiento Separado); con Biopsia",null,1,"D",99,"A","4","A"]
[99,"69420","Miringotomia Incluyendo Aspiracion y/o Insuflaci On de Conducto de Eustaquio",null,1,"D",99,"A","4","A"]
[13138,"69421","Miringotomia Incluyendo Aspiracion y/o Insuflacion de Conducto de Eustaquio con Necesidad Deanestesia General",null,1,"D",99,"A","4","A"]
[13139,"31237","Endoscopia Nasal/Sinusoidal, Quirurgica; con Biopsia, Polipectomia o Desbridamiento (Procedimientoseparado)",null,1,"D",99,"A","4","A"]
[13140,"69801","Laberintotomia, con o sin Criocirugia Incluyendo Otros Procedimientos Destructivos No Escisionales Operfusion con Compuestos Vestibuloactivos (Una o Varias Perf",null,1,"D",99,"A","4","A"]
[13141,"69802","Laberintotomia, con o sin Criocirugia Incluyendo Otros Procedimientos Destructivos No Escisionales o Perfusion con Compuestos Vestibuloactivos (Una o Varias Per",null,1,"D",99,"A","4","A"]
[13142,"69905","Laberintectomia; Transconducto",null,1,"D",99,"A","4","A"]
[13143,"31000","Lavaje Por Canulacion; Seno Maxilar (Puncion del Antro U Ostium Natural)",null,1,"D",99,"A","4","A"]
[13144,"21209","Osteoplastia, Huesos Faciales; Plastia de Reduccion",null,1,"D",99,"A","4","A"]
[13145,"30905","Control de Hemorragia Nasal, Posterior, con Empaque Postnasal y/o Cauterizacion Posterior, Cualquiermetodo; Inicial",null,1,"D",99,"A","4","A"]
[13146,"92511","Nasofaringoscopia con Endoscopio (Procedimiento Separado)",null,2,"A",99,"A","4","A"]
[13147,"67930","Sutura de Herida Reciente, Parpado, Que Involucre Borde del Parpado, Tarso y/o Conjuntiva Palpebral,Cierre Directo; Espesor Parcial",null,1,"D",99,"A","4","A"]
[13148,"65420","Escision o Transposicion de Pterigion; sin Injerto",null,1,"D",99,"A","4","A"]
[13149,"65426","Escision o Transposicion de Pterigion; con Injerto",null,1,"D",99,"A","4","A"]
[13150,"21340","Tratamiento Percutaneo de Fractura de Complejo Nasoetmoidal, con Fijacion con Ferula, Alambre Ocasquete Craneal de Yeso, Incluyendo Correccion de Ligamentos Pal",null,1,"D",99,"A","4","A"]
[13151,"67935","Sutura de Herida Reciente, Parpado, Que Involucre Borde del Parpado, Tarso y/o Conjuntiva Palpebral, Cierre Directo; Espesor Total",null,1,"D",99,"A","4","A"]
[13152,"67903","Correccion de Blefaroptosis; Reseccion o Avance de (Tarso)Elevador, Abordaje Interno",null,1,"D",99,"A","4","A"]
[13153,"67904","Correccion de Blefaroptosis; Reseccion o Avance de (Tarso)Elevador, Abordaje Externo",null,1,"D",99,"A","4","A"]
[13154,"67921","Correccion de Entropion; Sutura",null,1,"D",99,"A","4","A"]
[13155,"66820","Discision (Incision) de Catarata Membranosa Secundaria (Opacidad Capsular Posterior y/o Hialoideanterior); Töcnica con Instrumento Cortante (Cuchillo de Ziegler",null,1,"D",99,"A","4","A"]
[13156,"66830","Extirpacion de Catarata Membranosa Secundaria (Opacidad Capsular Posterior y/o Hialoide Anterior) Conseccion Corneo-Escleral, con o sin Iridectomia (Iridocapsul",null,1,"D",99,"A","4","A"]
[13157,"66984","Extirpacion de Catarata Extracapsular con Insercion de Protesis de Cristalino Intraocular Facoemulsificacion)",null,1,"D",99,"A","4","A"]
[13158,"66761","Iridotomia/Iridectomia por cirugia laser",null,1,"D",99,"A","4","A"]
[13159,"66150","Fistulizacion de Esclerotica Debido A Glaucoma; Trepanacion con Iridectomia",null,1,"D",99,"A","4","A"]
[13160,"67101","Correccion de Desprendimiento de Retina, Una o Mas Sesiones; Crioterapia o Diatermia, con o Sindrenaje de Fluido Subrretinal",null,1,"D",99,"A","4","A"]
[13161,"67105","Correccion de Desprendimiento de Retina, Una o Mas Sesiones; Fotocoagulacion, con o sin Drenaje de Fluido Subrretinal",null,1,"D",99,"A","4","A"]
[13162,"67107","Correccion de Desprendimiento de Retina; con \"Hebilla\" de Esclerotica (Indentacion Escleral) (Tal Como Diseccion Escleral Lamelar, Procedimiento de Imbricacion",null,1,"D",99,"A","4","A"]
[13163,"67108","Correc Desprendim Retina; C/ Vitrectomia, Cualquier Metodo, C/S Taponamiento C/ Aire o Gas Expansivo, Fotocoag C/ Endolaser Focal, Crioterapia, Drena Fluido Sub",null,1,"D",99,"A","4","A"]
[13164,"67110","Correccion de Desprendimiento de Retina; Mediante Inyeccion de Aire U Otro Gas (P. Ej. Retinopexia Neumotica)",null,1,"D",99,"A","4","A"]
[13165,"67112","Correc Desprend Retina; C/ \"Hebilla\" de Esclerotica (Indentacion Escleral) o Vitrectomia, en Paciente Que Ha Tenido Reparacion(Es) Previa(S) de Desprendimiento",null,1,"D",99,"A","4","A"]
[13166,"68520","Escision de Saco Lagrimal (Dacriocistectomia)",null,1,"D",99,"A","4","A"]
[13167,"68500","Escision de Glandula Lagrimal (Dacrioadenectomia) Excepto Por Tumor; Total",null,1,"D",99,"A","4","A"]
[13168,"68505","Escision de Glandula Lagrimal (Dacrioadenectomia) Excepto Por Tumor; Parcial",null,1,"D",99,"A","4","A"]
[13169,"68420","Incision, Drenaje de Saco Lagrimal (Dacriocistotomia o Dacriocistostomia)",null,1,"D",99,"A","4","A"]
[13170,"67311","Cirugia para Estrabismo, Procedimiento de Recesion o Reseccion; Un Musculo Horizontal",null,1,"D",99,"A","4","A"]
[13171,"67314","Cirugia para Estrabismo, Procedimiento de Recesion o Reseccion; Un Musculo Vertical (Excluyendo el Oblicuo Superior)",null,1,"D",99,"A","4","A"]
[13172,"67318","Cirugia para Estrabismo, Cualquier Procedimiento, Musculo Oblicuo Superior",null,1,"D",99,"A","4","A"]
[13173,"26525","Capsulectomia o Capsulotomia; Articulacion Interfalangica, Cada Articulacion",null,1,"D",99,"A","4","A"]
[13174,"26520","Capsulectomia o Capsulotomia; Articulacion Metacarpofalangica, Cada Articulacion",null,1,"D",99,"A","4","A"]
[13175,"32540","Enucleacion Extrapleural de Empiema (Empiemectomia)",null,1,"D",99,"A","4","A"]
[13176,"65450","Destruccion de Lesion de Cornea Mediante Crioterapia, Fotocoagulacion o Termocauterizacion",null,1,"D",99,"A","4","A"]
[13177,"65710","Queratoplastia (Trasplante de Cornea); Lamelar",null,1,"D",99,"A","4","A"]
[13178,"65730","Queratoplastia (Trasplante de Cornea); Penetrante (Excepto en Afaquia)",null,6,"A",99,"A","4","A"]
[13179,"65750","Queratoplastia (Trasplante de Cornea); Penetrante (En Afaquia)",null,6,"A",99,"A","4","A"]
[13180,"65755","Queratoplastia (Trasplante de Cornea); Penetrante (En Pseudoafaquia)",null,1,"D",99,"A","4","A"]
[13181,"67227","Destruccion de Retinopatia Extensa o Progresiva (P. Ej. Retinopatia Diabetica), Una o Mas Sesiones; Crioterapia, Diatermia",null,1,"D",99,"A","4","A"]
[13182,"66762","Iridoplastia Medi. Fotocoagulacion (Una o Mas Sesiones) (P/Ej. para Mejorar la Vision, Paraensanchamiento del Angulo de la Camara Ant.)",null,1,"D",99,"A","4","A"]
[13183,"67220","Destruccion de Lesion Localizada de Coroides (P. Ej. Neovascularizacion Coroidal), Una o Mas Sesiones, Fotocoagulacion (Laser)",null,1,"D",99,"A","4","A"]
[13184,"65855","Trabeculoplastia por Laser",null,1,"D",99,"A","4","A"]
[13185,"92083","Examen Extendido (P. Ej., Campos Visuales Goldman con Graficacion de Por Lo Menos 3 Isopteros y Determinacion Estatica Dentro de Los 30? Centrales, o Perimetria",null,1,"D",99,"A","4","A"]
[13186,"92020","Gonioscopia",null,1,"D",99,"A","4","A"]
[13187,"68801","Dilatacion de Punto Lagrimal (Punctum Lacrimale), con o sin Irrigacion",null,1,"D",99,"A","4","A"]
[13188,"76516","Biometria ocular por ultrasonido",null,1,"D",99,"A","4","A"]
[13189,"92275","Electrorretinograma",null,1,"D",99,"A","4","A"]
[13190,"92230","Angioscopia con Fluoresceina, con Interpretacion E Informe",null,1,"D",99,"A","4","A"]
[13191,"67938","Extirpacion de Cuerpo Extrano Internalizado, Parpado",null,1,"D",99,"A","4","A"]
[13192,"93303","Ecocardiografia Transtoracica para Anomalias Cardiacas Congenitas; Completa",null,1,"D",99,"A","4","A"]
[13193,"86580","Prueba intradermica para TBC (PPD)",null,1,"D",99,"A","4","A"]
[13519,"15851","Retiro de puntos",null,1,"D",99,"A","4","A"]
[13520,"40819","Excision de frenillo, labial o bucal (Frenumectomia, Frenulectomia, Frenectomia)",null,1,"D",99,"A","4","A"]
[13521,"58300","Insercion de dispositivo intrauterino (DIU)","F",10,"A",60,"A","4","A"]
[13522,"58301","Remocion de dispositivo intrauterino (DIU)","F",10,"A",60,"A","4","A"]
[13523,"70320","Radiografia dental panoramica",null,1,"D",99,"A","4","A"]
[13524,"77057","Mamografia screening",null,10,"A",99,"A","4","A"]
[13525,"81003","Examen de orina no automatizado con microscopia",null,1,"D",99,"A","4","A"]
[13526,"81015","Examen microscopico de sedimento urinario",null,1,"D",99,"A","4","A"]
[13527,"85014","Hematocrito",null,1,"D",99,"A","4","A"]
[13528,"85015","Hemoglobina",null,1,"D",99,"A","4","A"]
[13529,"96365","Infusion intravenosa",null,1,"D",99,"A","4","A"]
[13530,"99201","Consulta ambulatoria primer nivel de atencion",null,1,"D",99,"A","4","I"]
[13531,"99203","Consulta ambulatoria en II, III nivel de atencion",null,1,"D",99,"A","4","I"]
[13532,"99204","Consulta ambulatoria prolongada en II, III nivel de atencion",null,1,"D",99,"A","4","I"]
[13533,"99207","Atencion en salud mental",null,1,"D",99,"A","7","I"]
[13534,"99208","Atencion en planificacion familiar",null,1,"D",99,"A","4","I"]
[13535,"99209","Atencion en nutricion",null,1,"D",99,"A","4","A"]
[13536,"99210","Atencion de servicio social",null,1,"D",99,"A","4","A"]
[13537,"99304","Atencion de enfermeria en I nivel de atencion",null,1,"D",99,"A","4","A"]
[13538,"99305","Atencion de enfermeria en II,III nivel de atencion",null,1,"D",99,"A","4","A"]
[13539,"99342","Visita medica domiciliaria",null,1,"D",99,"A","4","A"]
[13540,"99344","Visita familiar integral",null,1,"D",99,"A","4","A"]
[13541,"99401","Consejeria integral",null,1,"D",99,"A","7","A"]
[13542,"99402","Consejeria Planificacion Familiar",null,1,"D",99,"A","7","A"]
[13543,"99403","Consejeria nutricional",null,1,"D",99,"A","7","A"]
[13544,"99404","Consejeria especial (VIH/Salud mental)",null,1,"D",99,"A","7","A"]
[13545,"99411","Sesion de Estimulacion Temprana",null,1,"D",50,"A","7","A"]
[13546,"99460","Atencion inmediata del recien nacido",null,0,"0",0,"0","2","A"]
[13547,"C0001","Reunion en Municipios",null,0,"0",0,"0","2","A"]
[13548,"C0002","Reunion en Instituciones Educativas",null,0,"0",0,"0","2","A"]
[13549,"C0003","Reunion en comunidad",null,0,"0",0,"0","2","A"]
[13550,"C0004","Taller para Municipios",null,0,"0",0,"0","2","A"]
[13551,"C0005","Taller para Insituciones Educativas",null,0,"0",0,"0","2","A"]
[13552,"C0006","Taller para la Comunidad",null,0,"0",0,"0","2","A"]
[13553,"C0007","Taller para la Familia",null,0,"0",0,"0","2","A"]
[13554,"C0008","Taller para Personal de Salud",null,0,"0",0,"0","2","A"]
[13555,"C0009","Sesion Educativa",null,0,"0",0,"0","2","A"]
[13556,"C0010","Sesion Demostrativa",null,0,"0",0,"0","4","A"]
[13557,"C0011","Visita Comunitaria Integral",null,0,"0",0,"0","2","A"]
[13558,"C0012","Sesion de Grupo de ayuda mutua",null,0,"0",0,"0","4","A"]
[13559,"D0120","Examen estomatologico",null,1,"D",99,"A","4","A"]
[13560,"D0220","Radiografia intraoral periapical",null,1,"D",99,"A","4","A"]
[13561,"D1110","Profilaxis dental",null,2,"A",99,"A","4","A"]
[13562,"D1120","Destartraje",null,2,"A",99,"A","4","I"]
[13563,"D1201","Aplicacion topica de fluor gel acidulado al 1.23%",null,2,"A",99,"A","4","I"]
[13564,"D1203","Aplicacion topica de fluor gel neutro",null,2,"A",99,"A","4","I"]
[13565,"D1225","Aplicacion de Barniz de fluor",null,2,"A",99,"A","4","I"]
[13566,"D1351","Aplicacion de sellantes",null,2,"A",99,"A","4","A"]
[13567,"D3220","Pulpotomia",null,1,"D",99,"A","4","A"]
[13568,"D3230","Pulpectomia anterior dientes deciduo",null,1,"D",99,"A","4","A"]
[13569,"D7118","Apicectomia y curetaje apical en piezas anteriores",null,9,"A",99,"A","4","A"]
[13570,"D7148","Tratamiento alveolitis granulomatosa o curetaje alveolar",null,1,"D",99,"A","4","A"]
[13571,"D7176","Extraccion dental simple",null,1,"D",99,"A","4","A"]
[13572,"D7180","Extraccion quirurgica dental o extraccion impactada/exodoncia compleja tercera molar",null,1,"D",99,"A","4","A"]
[13573,"D7182","Ferulizacion dentaria con resina por pieza",null,1,"D",99,"A","4","A"]
[13574,"D7218","Operculectomia o exposicion de pieza dentaria incluida tejido blando",null,1,"D",99,"A","4","A"]
[13575,"43235","Endoscopia gastrointestinal alta",null,1,"D",99,"A","4","A"]
[13576,"86592","Prueba de sifilis cualitativa (VDRL,RPR)",null,1,"D",99,"A","4","A"]
[13577,"43239","Biopsia de lesion de estomago",null,1,"D",99,"A","4","A"]
[13578,"83718","HDL colesterol",null,1,"D",99,"A","4","A"]
[13579,"27120","Acetabuloplastia",null,1,"D",99,"A","4","I"]
[13580,"82746","Acido folico serico",null,1,"D",99,"A","4","I"]
[13581,"84550","Acido urico",null,1,"D",99,"A","4","I"]
[13582,"82020","Adenosinadeaminasa (ADA)",null,1,"D",99,"A","4","I"]
[13583,"86000","Aglutinaciones",null,1,"D",99,"A","4","I"]
[13584,"87254","Aislamiento con tecnica de Shell Vial",null,1,"D",99,"A","4","A"]
[13585,"87250","Aislamiento viral por inoculacion en huevos o animales pequeõos,incluye observacion y diseccion",null,1,"D",99,"A","4","A"]
[13586,"D9952","Ajuste oclusal completo",null,1,"D",99,"A","4","A"]
[13587,"82055","Alcohol en sangre",null,1,"D",99,"A","4","A"]
[13588,"82105","Alfa fetoproteina (AFP) serica",null,1,"D",99,"A","4","A"]
[13589,"41874","Alveoloplastia con exodoncia por cuadrante",null,1,"D",99,"A","4","A"]
[13590,"59000","Amniocentesis",null,1,"D",99,"A","4","A"]
[13591,"59070","Amnioinfusion Transabdominal",null,1,"D",99,"A","4","A"]
[13592,"76497","Angio tomografia espiral multicorte (AngioTEM Craneo)",null,1,"D",99,"A","4","A"]
[13593,"75650","Angiografia cervico cerebral",null,1,"D",99,"A","4","A"]
[13594,"92235","Angiografia con fluoresceina",null,1,"D",99,"A","4","A"]
[13595,"93556","Angiografia coronaria selectiva",null,1,"D",99,"A","4","A"]
[13596,"86147","Anti cardiolipina IgG",null,1,"D",99,"A","4","I"]
[13597,"85732","Anticoagulante lupico",null,1,"D",99,"A","4","I"]
[13598,"86200","Anticuerpo peptido citrulinado ciclico (anti-CCP)",null,1,"D",99,"A","4","I"]
[13599,"86256","Anticuerpos anticitoplasmatico del neutrofilo (ANCA)",null,1,"D",99,"A","4","I"]
[13600,"86148","Anticuerpos antifosfolipidos",null,13,"A",99,"A","4","I"]
[13601,"86038","Anticuerpos antinucleares (ANA)",null,1,"D",99,"A","4","I"]
[13602,"86800","Anticuerpos antitiroideos",null,1,"D",99,"A","4","I"]
[13603,"86644","Anticuerpos para Citomegalovirus",null,1,"D",99,"A","4","I"]
[13604,"86645","Anticuerpos para Citomegalovirus IgM",null,1,"D",99,"A","4","I"]
[13605,"86695","Anticuerpos para Herpes simple, tipo 1",null,1,"D",99,"A","4","I"]
[13606,"86747","Anticuerpos para Parvovirus",null,1,"D",99,"A","4","I"]
[13607,"86765","Anticuerpos para Rubeola",null,1,"D",99,"A","4","I"]
[13608,"86777","Anticuerpos para Toxoplasma",null,1,"D",99,"A","4","I"]
[13609,"86778","Anticuerpos para Toxoplasma IgM",null,1,"D",99,"A","4","I"]
[13610,"86060","Antiestreptolisina O ASO",null,1,"D",99,"A","4","A"]
[13611,"82378","Antigeno carcinoembrionario (CEA)",null,1,"D",99,"A","4","A"]
[13612,"84152","Antigeno Prostatico Especifico (PSA)","M",10,"A",99,"A","4","A"]
[13613,"84154","Antigeno Prostatico Especifico (PSA) libre","M",10,"A",99,"A","4","A"]
[13614,"85301","Antitrombina",null,1,"D",99,"A","4","A"]
[13615,"44950","Apendicectomia",null,1,"D",99,"A","4","I"]
[13616,"44970","Apendicectomia laparoscopica",null,1,"D",99,"A","4","I"]
[13617,"44960","Apendicectomia por apendice con ruptura de absceso o peritonitis generalizada",null,1,"D",99,"A","4","I"]
[13618,"D3351","Apexificacion visita inicial",null,1,"D",99,"A","4","A"]
[13619,"D3353","Apexificacion visita final",null,1,"D",99,"A","4","A"]
[13620,"29010","Aplicacion de corse de yeso",null,1,"D",99,"A","4","A"]
[13621,"29125","Aplicacion de ferula en antebrazo",null,1,"D",99,"A","4","A"]
[13622,"97028","Aplicacion de luz ultravioleta",null,1,"D",99,"A","4","A"]
[13623,"97026","Aplicacion de rayos infrarrojos",null,1,"D",99,"A","4","A"]
[13624,"29075","Aplicacion de yeso corto de brazo o pierna (codo a dedo)",null,1,"D",99,"A","4","A"]
[13625,"29065","Aplicacion de yeso de hombro a mano",null,1,"D",99,"A","4","A"]
[13626,"29085","Aplicacion de yeso de mano a antebrazo bajo (guante)",null,1,"D",99,"A","4","A"]
[13627,"29405","Aplicacion de yeso de rodilla a dedos del pie",null,1,"D",99,"A","4","A"]
[13628,"29345","Aplicacion de yeso largo para la pierna (muslo a tobillo o dedos)",null,1,"D",99,"A","4","A"]
[13629,"29325","Aplicacion de yeso pelvipedio",null,1,"D",99,"A","4","A"]
[13630,"29058","Aplicacion de yeso toraco-braquial (tipo velpeau)",null,1,"D",99,"A","4","A"]
[13631,"94656","Apoyo ventilatorio no invasivo",null,1,"D",99,"A","4","A"]
[13632,"20600","Artrocentesis",null,1,"D",99,"A","4","A"]
[13633,"73525","Artrografia de cadera",null,1,"D",99,"A","4","A"]
[13634,"C7004","Asistencia Tecnica",null,0,"0",0,"0","2","A"]
[13635,"59813","Aspiracion Manual Endouterina (AMEU)","F",10,"A",99,"A","4","I"]
[13636,"38220","Aspirado de medula osea",null,1,"D",99,"A","4","A"]
[13637,"99283","Atencion de Emergencia Prioridad II",null,1,"D",99,"A","4","A"]
[13638,"99282","Atencion de Emergencia, Prioridad I (Urgencia))",null,1,"D",99,"A","4","A"]
[13639,"99284","Atencion de Emergencia, Prioridad III",null,1,"D",99,"A","4","A"]
[13640,"99234","Atencion en sala de observacion",null,1,"D",99,"A","4","A"]
[13641,"D0145","Atencion estomatologica basica",null,1,"D",99,"A","4","A"]
[13642,"99296","Atencion paciente-dia cuidados intermedios",null,1,"D",99,"A","4","I"]
[13643,"99231","Atencion paciente-dia hospitalizacion",null,1,"D",99,"A","4","I"]
[13644,"99291","Atencion paciente-dia UCI.",null,1,"D",99,"A","4","I"]
[13645,"59425","Atencion prenatal",null,1,"D",99,"A","4","I"]
[13646,"92557","Audiometria",null,1,"D",99,"A","4","A"]
[13647,"87115","Baciloscopia BK",null,1,"D",99,"A","4","I"]
[13648,"80048","Bateria metabolica basica",null,1,"D",99,"A","4","I"]
[13649,"82248","Bilirrubina directa",null,1,"D",99,"A","4","A"]
[13650,"82247","Bilirrubina total",null,1,"D",99,"A","4","A"]
[13651,"58100","Biopsia de endometrio","F",10,"A",99,"A","4","A"]
[13652,"38221","Biopsia de medula osea",null,1,"D",99,"A","4","A"]
[13653,"38505","Biopsia de nodulo linfatico por aspiracion",null,1,"D",99,"A","4","A"]
[13654,"32400","Biopsia de pleura percutanea",null,1,"D",99,"A","4","A"]
[13655,"60100","Biopsia de tiroides percutanea",null,1,"D",99,"A","4","A"]
[13656,"76942","Biopsia guiada por ecografia",null,1,"D",99,"A","4","A"]
[13657,"47000","Biopsia hepatica, aguja percutanea",null,1,"D",99,"A","4","A"]
[13658,"47100","Biopsia hepatica, en cuõa",null,1,"D",99,"A","4","A"]
[13659,"38500","Biopsia o escision de nodulo linfatico",null,1,"D",99,"A","4","A"]
[13660,"19102","Biopsia percutanea de mama con imagenes",null,1,"D",99,"A","4","A"]
[13661,"35526","By pass (aorto coronario) aortosubclavia o carotida",null,1,"D",99,"A","4","I"]
[13662,"82330","Calcio ionico",null,1,"D",99,"A","4","I"]
[13663,"82310","Calcio serico",null,1,"D",99,"A","4","I"]
[13664,"82340","Calcio urinario cuantitativo",null,1,"D",99,"A","4","I"]
[13665,"15852","Cambio de apositos y curaciones bajo anestesia",null,1,"D",99,"A","4","A"]
[13666,"36510","Cateterizacion de vena umbilical en RN",null,1,"D",99,"A","4","A"]
[13667,"85999","Celulas LE",null,1,"D",99,"A","4","I"]
[13668,"57700","Cerclaje",null,1,"D",99,"A","4","A"]
[13669,"59514","Cesarea",null,1,"D",99,"A","4","I"]
[13670,"40700","Cirugia correctiva de fisura labial",null,1,"D",99,"A","4","A"]
[13671,"42200","Cirugia correctiva de paladar hendido",null,1,"D",99,"A","4","A"]
[13672,"66821","Cirugia laser para escision de catarata",null,1,"D",99,"A","4","A"]
[13673,"D4241","Colgajo periodontal con alisado radicular de 1 a 3 dientes contiguos o espacios dentales vecinos por cuadrante",null,1,"D",99,"A","4","A"]
[13674,"57260","Cirugia reparadora de prolapso genital (colporrafia anteroposterior)",null,1,"D",99,"A","4","A"]
[13675,"52000","Cistouretroscopia",null,1,"D",99,"A","4","A"]
[13676,"88142","Citopatologia cervical o vaginal","F",10,"A",99,"A","4","A"]
[13677,"88141","Citopatologia cervical o vaginal y tamizaje manual (Papanicolau)","F",10,"A",99,"A","4","A"]
[13678,"88104","Citopatologia de fluidos, lavados o aspirados",null,1,"D",99,"A","4","A"]
[13679,"84999","Citoquimico de fluidos (excepto sangre, orina, heces)",null,1,"D",99,"A","4","I"]
[13680,"43260","Colangiopancreatografia endoscopica retrograda (CPRE); diagnostica o terapeutica",null,1,"D",99,"A","4","A"]
[13681,"47600","Colecistectomia",null,1,"D",99,"A","4","I"]
[13682,"47605","Colecistectomia con colangiografia",null,1,"D",99,"A","4","I"]
[13683,"47610","Colecistectomia con exploracion de conducto biliar comun (coledoco)",null,1,"D",99,"A","4","I"]
[13684,"47562","Colecistectomia laparoscopica",null,1,"D",99,"A","4","I"]
[13685,"47563","Colecistectomia laparoscopica con colangiografia",null,1,"D",99,"A","4","I"]
[13686,"44140","Colectomia parcial",null,1,"D",99,"A","4","A"]
[13687,"82465","Colesterol total, en suero o sangre total",null,1,"D",99,"A","4","A"]
[13688,"93503","Colocacion de Cateter Swan Ganz",null,1,"D",99,"A","4","A"]
[13689,"36557","Colocacion de Cateter venoso central CVC",null,1,"D",99,"A","4","A"]
[13690,"53445","Colocacion de sonda foley",null,1,"D",99,"A","4","A"]
[13691,"45380","Colonoscopia con biopsia",null,1,"D",99,"A","4","A"]
[13692,"44320","Colostomia o cecostomia con exteriorizacion a la piel",null,1,"D",99,"A","4","A"]
[13693,"86160","Complemento:C3,C4",null,1,"D",99,"A","4","I"]
[13694,"D0160","Consulta estomatologica especializada",null,1,"D",99,"A","4","A"]
[13695,"87045","Coprocultivo",null,1,"D",99,"A","4","I"]
[13696,"59012","Cordocentesis",null,1,"D",99,"A","4","I"]
[13697,"13100","Correccion compleja de heridas",null,1,"D",99,"A","4","A"]
[13698,"44055","Correccion de mal rotacion mediante lisis de bandas duodenales y/o reduccion de volvulo de intestino medio por via laparoscopica",null,1,"D",99,"A","4","A"]
[13699,"82533","Cortisol Total",null,1,"D",99,"A","4","I"]
[13700,"61312","Craniectomia o craneotomia para evacuacion de hematoma supratentorial, extradural o subdural",null,1,"D",99,"A","4","I"]
[13701,"61516","Craniectomia o craneotomia para excision de quiste supratentorial",null,1,"D",99,"A","4","I"]
[13702,"33025","Creacion de ventana pericardica",null,1,"D",99,"A","4","I"]
[13703,"82553","Creatina fosfoquinasa MB (CPK-MB)",null,1,"D",99,"A","4","I"]
[13704,"82550","Creatina fosofquinasa total (CPK-Total)",null,1,"D",99,"A","4","I"]
[13705,"82565","Creatinina en sangre",null,1,"D",99,"A","4","A"]
[13706,"57061","Criocirugia",null,1,"D",99,"A","4","A"]
[13707,"87799","Cuantificacion de ADN o ARN, por cada organismo",null,1,"D",99,"A","4","I"]
[13708,"87536","Cuantificacion de ADN o ARN; HIV (Carga viral)",null,1,"D",99,"A","4","I"]
[13709,"57020","Culdocentesis",null,1,"D",99,"A","4","I"]
[13710,"87070","Cultivo bacteriano (no sangre, orina ni heces)",null,1,"D",99,"A","4","I"]
[13711,"87102","Cultivo de hongos",null,1,"D",99,"A","4","I"]
[13712,"87230","Cultivo de tejidos para analisis de toxinas (Ensayo de toxinas o antitoxinas mediante cultivo de tejidos)",null,1,"D",99,"A","4","I"]
[13713,"87116","Cultivo para micobacteria",null,1,"D",99,"A","4","I"]
[13714,"97597","Curacion de heridas",null,1,"D",99,"A","4","A"]
[13715,"D4220","Curetaje gingival  - por cuadrante",null,1,"D",99,"A","4","A"]
[13716,"16010","Debridamiento y/o limpieza quirurgica de quemaduras bajo anestesia",null,1,"D",99,"A","4","A"]
[13717,"77080","Densitometria Osea",null,1,"D",99,"A","4","A"]
[13718,"82575","Depuracion de creatinina",null,1,"D",99,"A","4","A"]
[13719,"62220","Derivacion ventriculo-atrial",null,1,"D",99,"A","4","A"]
[13720,"62223","Derivacion ventriculo-peritoneal",null,1,"A",99,"A","4","A"]
[13721,"97532","Desarrollo de habilidades cognitivas",null,1,"D",99,"A","4","A"]
[13722,"11000","Desbridamiento de eccema o infeccion de la piel",null,1,"D",99,"A","4","A"]
[13723,"87449","Deteccion de agente infeccioso por ELISA",null,1,"D",99,"A","4","I"]
[13724,"87299","Deteccion de agente infeccioso por inmunofluorescencia directa",null,1,"D",99,"A","4","I"]
[13725,"87797","Deteccion de agente infeccioso por medio de acidos nucleicos",null,1,"D",99,"A","4","I"]
[13726,"87015","Deteccion de agentes infecciosos por concentracion",null,1,"D",99,"A","4","I"]
[13727,"86611","Deteccion de anticuerpos a Bartonella",null,1,"D",99,"A","4","I"]
[13728,"86705","Deteccion de anticuerpos anticore IgM para nucleo de virus de Hepatitis B",null,1,"D",99,"A","4","A"]
[13729,"86707","Deteccion de anticuerpos e de Hepatitis B (HBeAb)",null,1,"D",99,"A","4","I"]
[13730,"86706","Deteccion de anticuerpos para HBs-Ag",null,1,"D",99,"A","4","A"]
[13731,"86704","Deteccion de anticuerpos totales para nucleo de virus de Hepatitis B (Total Anti-Hbcore)",null,1,"D",99,"A","4","A"]
[13732,"87340","Deteccion de antigeno de superficie de virus de Hepatitis B (HBsAg) por ELISA",null,1,"D",99,"A","4","A"]
[13733,"87320","Deteccion de Chlamydia trachomatis",null,1,"D",99,"A","4","I"]
[13734,"86768","Deteccion para anticuerpos contra salmonella",null,1,"D",99,"A","4","I"]
[13735,"99173","Determinacion de agudeza visual bilateral",null,1,"D",99,"A","4","A"]
[13736,"86622","Determinacion de anticuerpos para Brucella",null,1,"D",99,"A","4","I"]
[13737,"86708","Determinacion de anticuerpos para Hepatitis A",null,1,"D",99,"A","4","A"]
[13738,"86793","Determinacion de anticuerpos para Yersinia",null,1,"D",99,"A","4","I"]
[13739,"87350","Determinacion de HbeAg Antigeno epsilon",null,1,"D",99,"A","4","I"]
[13740,"85378","Dimero D",null,1,"D",99,"A","4","I"]
[13741,"93886","Doppler transcraneal (intracraneal)",null,1,"D",99,"A","4","A"]
[13742,"80164","Dosaje de Acido Valproico",null,1,"D",99,"A","4","I"]
[13743,"82150","Dosaje de amilasa",null,1,"D",99,"A","4","I"]
[13744,"80154","Dosaje de Benzodiazepinas",null,1,"D",99,"A","4","I"]
[13745,"80156","Dosaje de Carbamazepina total",null,1,"D",99,"A","4","I"]
[13746,"82607","Dosaje de Cianocobalamina (Vitamina B12)",null,1,"D",99,"A","4","I"]
[13747,"82480","Dosaje de Colinesterasa en suero",null,1,"D",99,"A","4","I"]
[13748,"80185","Dosaje de Fenitoina total",null,1,"D",99,"A","4","I"]
[13749,"85018","Dosaje de hemoglobina",null,1,"D",99,"A","4","A"]
[13750,"83036","Dosaje de hemoglobina glicosilada",null,1,"D",99,"A","4","A"]
[13751,"84443","Dosaje de hormona tiroestimulante (TSH)",null,1,"D",99,"A","4","I"]
[13752,"84207","Dosaje de piridoxina (Vitamina B6)",null,1,"D",99,"A","4","I"]
[13753,"84704","Dosaje de subunidad beta",null,1,"D",99,"A","4","I"]
[13754,"83520","Dosaje Enolasa Especifica",null,1,"D",99,"A","4","I"]
[13755,"82955","Dosaje G6PDH",null,1,"D",99,"A","4","I"]
[13756,"49021","Drenaje percutaneo de absceso peritoneal",null,1,"D",99,"A","4","A"]
[13757,"93314","Ecocardiografia trans esofagica (TEE)",null,1,"D",99,"A","4","A"]
[13758,"93307","Ecocardiografia Transtoracica",null,1,"D",99,"A","4","A"]
[13759,"76506","Ecografia Cerebral",null,1,"D",99,"A","4","A"]
[13760,"76775","Ecografia de vias urinarias",null,1,"D",99,"A","4","A"]
[13761,"76827","Ecografia Fetal Doppler",null,1,"D",99,"A","4","A"]
[13762,"76816","Ecografia obstetrica selectiva evaluacion morfologica del feto para descarte de malformaciones",null,1,"D",99,"A","4","A"]
[13763,"76817","Ecografia transvaginal obstetrica","F",10,"A",99,"A","4","A"]
[13764,"76705","Ecografia Vias Biliares",null,1,"D",99,"A","4","A"]
[13765,"80051","Electrolitos sericos",null,1,"D",99,"A","4","A"]
[13766,"95860","Electromiografia, una extremidad",null,1,"D",99,"A","4","A"]
[13767,"86790","ELISA  para Fiebre Amarilla",null,1,"D",99,"A","4","A"]
[13768,"86677","ELISA Helicobacter Pylori",null,1,"D",99,"A","4","A"]
[13769,"86703","ELISA o prueba rapida para HIV-1 y HIV-2",null,1,"D",99,"A","4","A"]
[13770,"75894","Embolizacion arteria uterina","F",10,"A",99,"A","4","A"]
[13771,"36470","Embolizacion de arteria uterina: Oclusion o embolizacion transcateter","F",10,"A",99,"A","4","A"]
[13772,"44120","Enterectomia, reseccion del intestino delgado",null,1,"D",99,"A","4","A"]
[13773,"44130","Enteroenterostomia, anastomosis de intestino, con o sin enterostomia cutanea",null,1,"A",99,"A","4","A"]
[13774,"44005","Enterolisis (liberacion de adherencias intestinales)",null,1,"D",99,"A","4","A"]
[13775,"44180","Enterolisis (liberacion de adherencias intestinales) por laparoscopia",null,1,"D",99,"A","4","A"]
[13776,"59300","Episiotomia",null,1,"D",99,"A","4","A"]
[13777,"15999","Escarectomia",null,1,"D",99,"A","4","A"]
[13778,"16035","Escarotomia",null,1,"D",99,"A","4","A"]
[13779,"43204","Escleroterapia de varices esofagicas con esofagoscopia",null,1,"D",99,"A","4","A"]
[13780,"43205","Esofagoscopia con ligadura de varices esofagicas",null,1,"D",99,"A","4","A"]
[13781,"82143","Espectrofotometria del liquido amniotico",null,1,"D",99,"A","4","A"]
[13782,"82670","Estradiol",null,1,"D",99,"A","4","I"]
[13783,"82677","Estriol",null,1,"D",99,"A","4","I"]
[13784,"82679","Estrona",null,1,"D",99,"A","4","I"]
[13785,"88312","Estudio anatomopatologico con tincion especial",null,1,"D",99,"A","4","I"]
[13786,"88014","Estudio anatomo-patologico del feto",null,1,"D",99,"A","4","I"]
[13787,"88210","Estudio Citogenetico",null,1,"D",99,"A","4","I"]
[13788,"88172","Estudio citohistologico de muestra",null,1,"D",99,"A","4","I"]
[13789,"88261","Estudio de Cariotipo",null,1,"D",99,"A","4","I"]
[13790,"81050","Estudio de orina 24 horas",null,1,"D",99,"A","4","I"]
[13791,"95900","Estudio de velocidad, amplitud y latencia de conduccion nerviosa, nervio motor",null,1,"D",99,"A","4","A"]
[13792,"95904","Estudio de velocidad, amplitud y latencia de conduccion nerviosa, nervio sensitivo",null,1,"D",99,"A","4","A"]
[13793,"93923","Estudio fisiologico no invasivo arterial de las extremidades superiores o inferiores(Doppler arterial de extremidades)",null,1,"D",99,"A","4","A"]
[13794,"93965","Estudio fisiologico no invasivo venoso de extremidades (Doppler venoso  de extremidades)",null,1,"D",99,"A","4","A"]
[13795,"87163","Estudio histoquimico de liquido pleural",null,1,"D",99,"A","4","A"]
[13796,"93875","Estudio no invasivo de arterias extracraneales ( Ecografia Doppler )",null,1,"D",99,"A","4","A"]
[13797,"C7003","Evaluacion",null,0,"0",0,"0","2","A"]
[13798,"97001","Evaluacion de fisioterapia",null,1,"D",99,"A","4","A"]
[13799,"96115","Examen de estado neuroconductivo",null,1,"D",99,"A","4","A"]
[13800,"89055","Examen de leucocitos en heces",null,1,"D",99,"A","4","I"]
[13801,"81000","Examen de orina  con tira reactiva",null,1,"D",99,"A","4","A"]
[13802,"81001","Examen de orina automatizado con microscopia",null,1,"D",99,"A","4","I"]
[13803,"87177","Examen de parasitos y huevos por frotis directo (3 muestras), .",null,1,"A",99,"A","4","A"]
[13804,"87220","Examen de piel, cabello o uõas para examinar huevos o larvas de ectoparasitos (KOH)",null,10,"A",0,null,"4","I"]
[13805,"80090","Examen de TORCH",null,1,"D",99,"A","4","A"]
[13806,"D0150","Consulta estomatologica no especializada",null,1,"D",99,"A","4","I"]
[13807,"74000","Examen radiologico de abdomen AP",null,1,"D",99,"A","4","A"]
[13808,"74020","Examen radiologico de abdomen completa, incluye incidencia de pie y/o decubito",null,1,"D",99,"A","4","A"]
[13809,"73090","Examen radiologico de antebrazo, dos incidencias",null,1,"D",99,"A","4","A"]
[13810,"73000","Examen radiologico de clavicula, completa",null,1,"D",99,"A","4","A"]
[13811,"73070","Examen radiologico de codo; dos incidencias",null,1,"D",99,"A","4","A"]
[13812,"73080","Examen radiologico de codo; tres incidencias",null,1,"D",99,"A","4","A"]
[13813,"72040","Examen radiologico de columna cervical, 2 o 3 incidencias",null,1,"D",99,"A","4","A"]
[13814,"72080","Examen radiologico de columna dorsolumbar (2 vistas)",null,1,"D",99,"A","4","A"]
[13815,"72100","Examen radiologico de columna lumbosacra ( 2 a 3 vistas)",null,1,"D",99,"A","4","A"]
[13816,"72010","Examen radiologico de columna vertebral completa, anteroposterior y lateral",null,1,"D",99,"A","4","A"]
[13817,"73030","Examen radiologico de hombro,  2 incidencias",null,1,"D",99,"A","4","A"]
[13818,"73020","Examen radiologico de hombro,  una vista",null,1,"D",99,"A","4","A"]
[13819,"73060","Examen radiologico de humero, dos incidencias",null,1,"D",99,"A","4","A"]
[13820,"73120","Examen radiologico de mano, minimo dos incidencias",null,1,"D",99,"A","4","A"]
[13821,"73130","Examen radiologico de mano, minimo tres incidencias",null,1,"D",99,"A","4","A"]
[13822,"73110","Examen radiologico de muõeca,  3 vistas",null,1,"D",99,"A","4","A"]
[13823,"71100","Examen radiologico de parrilla costal",null,1,"D",99,"A","4","A"]
[13824,"73620","Examen radiologico de pie completo, minimo dos incidencias",null,1,"D",99,"A","4","A"]
[13825,"73630","Examen radiologico de pie completo, minimo tres incidencias",null,1,"D",99,"A","4","A"]
[13826,"73560","Examen radiologico de rodilla,  dos incidencias",null,1,"D",99,"A","4","A"]
[13827,"73562","Examen radiologico de rodilla,  tres incidencias",null,1,"D",99,"A","4","A"]
[13828,"73600","Examen radiologico de tobillo, 2 incidencias",null,1,"D",99,"A","4","A"]
[13829,"73510","Examen radiologico, cadera, de dos vistas",null,1,"D",99,"A","4","A"]
[13830,"70360","Examen radiologico, cuello, tejidos blandos",null,1,"D",99,"A","4","A"]
[13831,"71020","Examen radiologico, torax, frontal y lateral",null,1,"D",99,"A","4","A"]
[13832,"71010","Examen radiologico, torax; vista unica, frontal.",null,1,"D",99,"A","4","A"]
[13833,"21040","Excision de quiste benigno o de tumor de mandibula",null,1,"D",99,"A","4","A"]
[13834,"21030","Excision de tumor benigno o quiste de huesos faciales distinto de la mandibula",null,1,"D",99,"A","4","A"]
[13835,"D7172","Exodoncia a colgajo",null,1,"D",99,"A","4","A"]
[13836,"36450","Exsanguinotranfusion, neonato",null,1,"D",99,"A","4","I"]
[13837,"87210","Extendido de fuente primaria (examen en fresco)",null,1,"D",99,"A","4","I"]
[13838,"85060","Extendido de sangre periferica",null,1,"D",99,"A","4","I"]
[13839,"59414","Extraccion manual de placenta",null,1,"D",99,"A","4","A"]
[13840,"66982","Extraccionde catarata extracapsular con implante de lente intraocular",null,1,"D",99,"A","4","A"]
[13841,"66850","Facofragmentacion (mecanica o ultrasonido), con aspiracion",null,1,"D",99,"A","4","A"]
[13842,"86430","Factor reumatoideo cualitativo",null,1,"D",99,"A","4","I"]
[13843,"86901","Factor RH",null,1,"D",99,"A","4","I"]
[13844,"82728","Ferritina",null,1,"D",99,"A","4","I"]
[13845,"85384","Fibrinogeno",null,1,"D",99,"A","4","I"]
[13846,"82731","Fibronectina",null,1,"D",99,"A","4","I"]
[13847,"26650","Fijacion percutanea de fractura carpometacarpiana",null,1,"D",99,"A","4","A"]
[13848,"27216","Fijacion percutanea de fractura de pelvis",null,1,"D",99,"A","4","A"]
[13849,"27235","Fijacion percutanea de fractura femoral proximal",null,1,"D",99,"A","4","A"]
[13850,"25606","Fijacion percutanea de fractura radial",null,1,"D",99,"A","4","A"]
[13851,"D0140","Consulta estomatologica no especializada",null,1,"D",99,"A","4","A"]
[13852,"99195","Flebotomia terapeutica",null,1,"D",99,"A","4","A"]
[13853,"92250","Fondo de ojo",null,1,"D",99,"A","4","A"]
[13854,"84075","Fosfatasa alcalina",null,15,"A",99,"A","4","A"]
[13855,"83661","Fosfatidilglicerol o ratio lecitina/esfingomielina",null,15,"A",99,"A","4","I"]
[13856,"84100","Fosforo en sangre",null,1,"D",99,"A","4","I"]
[13857,"84105","Fosforo inorganico (fosfato); en orina",null,1,"D",99,"A","4","I"]
[13858,"96900","Fototerapia actinoterapia (luz ultravioleta)",null,1,"D",99,"A","4","A"]
[13859,"87207","Frotis con tincion especial para cuerpos de inclusion o parasitos (gota gruesa)",null,1,"D",99,"A","4","I"]
[13860,"83001","FSH",null,1,"D",99,"A","4","I"]
[13861,"78584","Gammagrafia de Perfusion pulmonar, particulas, con ventilacion, inhalacion unica",null,1,"D",99,"A","4","A"]
[13862,"78305","Gammagrafia osea y/o articular, multiples areas",null,1,"D",99,"A","4","A"]
[13863,"78006","Gammagrafia tiroidea",null,1,"D",99,"A","4","A"]
[13864,"82803","Gases arteriales",null,1,"D",99,"A","4","A"]
[13865,"43840","Gastrorrafia, sutura de ulcera duodenal o gastrica perforada, herida, o lesion",null,1,"D",99,"A","4","A"]
[13866,"D4210","Gingivectomia - gingivoplastia de 4 a mas dientes contiguos o espacios dentales vecinos por cuadrante o sextantes",null,3,"A",99,"A","4","A"]
[13867,"D2330","Restauracion fotocurable de una superficie con resina en piezas dentarias anteriores (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[13868,"82948","Glucosa (tira reactiva)",null,1,"D",99,"A","4","A"]
[13869,"82947","Glucosa cuantitativa en sangre",null,1,"D",99,"A","4","A"]
[13870,"82945","Glucosa en otros fluidos corporales (no sangre)",null,1,"D",99,"A","4","A"]
[13871,"82951","Glucosa, prueba de tolerancia, tres muestras",null,1,"D",99,"A","4","A"]
[13872,"84703","Gonadotrofina corionica cualitativa",null,1,"D",99,"A","4","I"]
[13873,"87205","Gram o giemsa de fuente primaria",null,1,"D",99,"A","4","I"]
[13874,"82705","Grasas o lipidos fecales",null,1,"D",99,"A","4","I"]
[13875,"86900","Grupo Sanguineo",null,1,"D",99,"A","4","I"]
[13876,"83010","Haptoglobina cuantitativa",null,1,"D",99,"A","4","I"]
[13877,"87040","Hemocultivo",null,1,"D",99,"A","4","I"]
[13878,"85007","Hemograma",null,1,"D",99,"A","4","A"]
[13879,"85027","Hemograma completo",null,1,"D",99,"A","4","I"]
[13880,"47010","Hepatotomia; para drenaje a cielo abierto de absceso o quiste",null,1,"D",99,"A","4","A"]
[13881,"47011","Hepatotomia; para drenaje percutaneo de absceso o quiste",null,1,"D",99,"A","4","A"]
[13882,"83540","Hierro serico",null,1,"D",99,"A","4","A"]
[13883,"58150","Histerectomia Abdominal Total c/s salpingooforectomia","F",1,"D",99,"A","4","I"]
[13884,"59350","Histerorrafia de ruptura uterina","F",10,"A",99,"A","4","I"]
[13885,"86812","HLA B27",null,1,"D",99,"A","4","I"]
[13886,"83090","Homocisteina",null,1,"D",99,"A","4","I"]
[13887,"86689","Identificacion de anticuerpo anti VIH 1-2 prueba confirmatoria (Western blot)",null,1,"D",99,"A","4","I"]
[13888,"D1352","Inactivacion de caries con Ionomero de Vidrio",null,1,"D",99,"A","4","A"]
[13889,"99199","Infiltraciones intraarticulares",null,1,"D",99,"A","4","A"]
[13890,"86320","Inmunoelectroforesis de suero",null,1,"D",99,"A","4","I"]
[13891,"86325","Inmunoelectroforesis y concentracion de otros liquidos (orina, LCR)",null,1,"D",99,"A","4","I"]
[13892,"86318","Inmunoensayo para anticuerpos de agentes infecciosos",null,1,"D",99,"A","4","I"]
[13893,"87280","Inmunofluorescencia VSR",null,1,"D",99,"A","4","I"]
[13894,"90384","Inmunoglobulina humana Anti Rh",null,1,"D",99,"A","4","I"]
[13895,"90375","Inmunoglobulina humana para rabia",null,1,"D",99,"A","4","A"]
[13896,"83525","Insulina",null,1,"D",99,"A","4","I"]
[13897,"83605","Lactato (æcido Lactico)",null,1,"D",99,"A","4","I"]
[13898,"83615","Lactato Deshidrogenasa (LDH)",null,1,"D",99,"A","4","I"]
[13899,"63045","Laminectomia con discectomia (Laminectomia, facetectomia y foraminotomia)",null,1,"D",99,"A","4","A"]
[13900,"49320","Laparoscopia diagnostica",null,1,"D",99,"A","4","A"]
[13901,"49000","Laparotomia Exploratoria",null,1,"D",99,"A","4","A"]
[13902,"31515","Laringoscopia directa.",null,1,"D",99,"A","4","A"]
[13903,"96101","Las pruebas psicologicas",null,1,"D",99,"A","4","A"]
[13904,"31624","Lavado bronquioalveolar",null,1,"D",99,"A","4","A"]
[13905,"83721","LDL colesterol",null,1,"D",99,"A","4","A"]
[13906,"59160","Legrado post parto","F",1,"D",99,"A","4","I"]
[13907,"59812","Legrado Uterino","F",10,"A",99,"A","4","I"]
[13908,"83002","LH",null,1,"D",99,"A","4","I"]
[13909,"37617","Ligadura arteria grande - abdomen",null,1,"D",99,"A","4","A"]
[13910,"43400","Ligadura de varices esofagicas con fibroscopio con o sin videocamara",null,1,"D",99,"A","4","A"]
[13911,"58600","Ligadura o seccion de trompas de Falopio","F",10,"A",59,"A","4","A"]
[13912,"11042","Limpieza quirurgica",null,1,"D",99,"A","4","A"]
[13913,"86361","Linfocitos T, recuento absoluto de CD4",null,1,"D",99,"A","4","I"]
[13914,"83690","Lipasa",null,1,"D",99,"A","4","I"]
[13915,"32480","Lobectomia",null,1,"D",99,"A","4","I"]
[13916,"87206","Luz de wood",null,1,"D",99,"A","4","A"]
[13917,"83735","Magnesio",null,1,"D",99,"A","4","I"]
[13918,"77056","Mamografia bilateral",null,1,"D",99,"A","4","A"]
[13919,"77055","Mamografia unilateal",null,1,"D",99,"A","4","A"]
[13920,"56440","Marsupializacion de glandula de Bartolino",null,1,"D",99,"A","4","A"]
[13921,"82040","Medicion de albumina serica",null,1,"D",99,"A","4","A"]
[13922,"82043","Microalbuminuria cuantitativa en orina",null,1,"D",99,"A","4","I"]
[13923,"92499","Microscopia especular",null,1,"D",99,"A","4","I"]
[13924,"87046","Mielocultivo",null,1,"D",99,"A","4","I"]
[13925,"58140","Miomectomia abordaje abdominal",null,1,"D",99,"A","4","A"]
[13926,"58545","Miomectomia laparoscopica",null,1,"D",99,"A","4","A"]
[13927,"C7001","Monitoreo",null,0,"0",0,"0","2","A"]
[13928,"93784","Monitoreo ambulatorio de la presion arterial (MAPA)",null,1,"D",99,"A","4","A"]
[13929,"93224","Monitoreo Holter",null,1,"D",99,"A","4","A"]
[13930,"32440","Neumonectomia",null,1,"D",99,"A","4","A"]
[13931,"32201","Neumonostomia; con drenaje percutaneo de absceso o quiste",null,1,"D",99,"A","4","A"]
[13932,"32200","Neumonotomia; para drenaje a cielo abierto de absceso o quiste",null,1,"D",99,"A","4","A"]
[13933,"62160","Neuroendoscopia intracraneal",null,1,"D",99,"A","4","A"]
[13934,"27161","Osteotomia femoral",null,1,"D",99,"A","4","A"]
[13935,"27158","Osteotomia pelvica",null,1,"D",99,"A","4","A"]
[13936,"94760","Oximetria no invasiva",null,1,"D",99,"A","4","A"]
[13937,"49080","Paracentesis",null,1,"D",99,"A","4","A"]
[13938,"83970","Paratohormona (PTH)",null,1,"D",99,"A","4","A"]
[13939,"59409","Parto vaginal","F",10,"A",99,"A","4","I"]
[13940,"88302","Patologia quirurgica, Estudio macro y microscopico de pieza operatoria especifica nivel II",null,1,"D",99,"A","4","A"]
[13941,"88304","Patologia quirurgica, Estudio macro y microscopico de pieza operatoria especifica nivel III",null,1,"D",99,"A","4","A"]
[13942,"88305","Patologia quirurgica, Estudio macro y microscopico de pieza operatoria especifica nivel IV",null,1,"D",99,"A","4","A"]
[13943,"88307","Patologia quirurgica, Estudio macro y microscopico de pieza operatoria especifica nivel V",null,1,"D",99,"A","4","A"]
[13944,"88309","Patologia quirurgica, Estudio macro y microscopico de pieza operatoria especifica nivel VI",null,1,"D",99,"A","4","A"]
[13945,"76818","Perfil biofisico fetal",null,1,"D",99,"A","4","A"]
[13946,"76819","Perfil biofisico fetal sin test no estresante","F",1,"D",99,"A","4","A"]
[13947,"80063","Perfil de coagulacion basico",null,1,"D",99,"A","4","A"]
[13948,"80076","Perfil hepatico",null,1,"D",99,"A","4","A"]
[13949,"80061","Perfil lipidico",null,1,"D",99,"A","4","A"]
[13950,"80072","Perfil reumatoideo",null,1,"D",99,"A","4","A"]
[13951,"33010","Pericardiocentesis",null,1,"D",99,"A","4","A"]
[13952,"83986","Ph en liquido corporal, exepto sangre (Ph vaginal, test de nitrazina)","F",1,"A",99,"A","4","A"]
[13953,"84132","Potasio serico",null,1,"D",99,"A","4","A"]
[13954,"92585","Potenciales evocados auditivos",null,1,"D",99,"A","4","A"]
[13955,"95930","Potenciales evocados visuales",null,2,"A",99,"A","4","A"]
[13956,"84145","Procalcitonina",null,1,"D",99,"A","4","A"]
[13957,"62287","Procedimiento de aspiracion o descompresion del nucleo pulposo",null,1,"D",99,"A","4","A"]
[13958,"97799","Procedimiento de medicina fisica / rehabilitacion",null,1,"D",99,"A","4","A"]
[13959,"97112","Procedimiento terapeutico para reeducacion neuromuscular del movimiento, equilibrio, coordinacion, sentido quinestesico, postura y propriocepcion.",null,1,"D",99,"A","4","A"]
[13960,"55801","Prostatectomia perineal radical","M",10,"A",99,"A","4","A"]
[13961,"85302","Proteina C",null,1,"D",99,"A","4","A"]
[13962,"86140","Proteina C reactiva",null,1,"D",99,"A","4","A"]
[13963,"85305","Proteina S",null,1,"D",99,"A","4","A"]
[13964,"84157","Proteinas en otros fluidos corporales",null,1,"D",99,"A","4","A"]
[13965,"84155","Proteinas Totales",null,1,"D",99,"A","4","A"]
[13966,"84165","Proteinas; fraccionamiento y determinacion cuantitativa por electroforesis",null,1,"D",99,"A","4","A"]
[13967,"82044","Proteinuria cualitativa en orina (tira reactiva)",null,1,"D",99,"A","4","A"]
[13968,"84156","Proteinuria de 24 horas",null,1,"D",99,"A","4","A"]
[13969,"D5110","Protesis dental completa maxilar",null,1,"D",99,"A","4","A"]
[13970,"D5211","Protesis removible parcial maxilar base de acrilico (termocurado)",null,1,"D",99,"A","4","A"]
[13971,"86486","Prueba cutanea para antigeno especifico",null,1,"D",99,"A","4","A"]
[13972,"87184","Prueba de sensibilidad",null,1,"D",99,"A","4","A"]
[13973,"82950","Prueba de sobrecarga de glucosa",null,1,"D",99,"A","4","I"]
[13974,"86780","Prueba especifica de Treponema pallidum (Ej FTA, TPHA)",null,1,"D",99,"A","4","I"]
[13975,"87190","Prueba se susceptibilidad de M. tuberculosis",null,1,"D",99,"A","4","I"]
[13976,"86920","Pruebas Cruzadas",null,1,"D",99,"A","4","I"]
[13977,"96110","Pruebas de desarrollo limitadas",null,1,"D",99,"A","4","I"]
[13978,"96111","Pruebas de desarrollo prolongado",null,1,"D",99,"A","4","I"]
[13979,"90846","Psicoterapia Familiar",null,1,"D",99,"A","4","A"]
[13980,"90806","Psicoterapia Individual",null,1,"D",99,"A","4","A"]
[13981,"D3240","Pulpectomia posterior diente deciduo",null,1,"D",99,"A","4","A"]
[13982,"10160","Puncion aspirativa de absceso, hematoma, quiste",null,1,"D",99,"A","4","A"]
[13983,"19000","Puncion con aguja fina de quiste de mama",null,1,"D",99,"A","4","A"]
[13984,"62270","Puncion lumbar",null,1,"D",99,"A","4","A"]
[13985,"61020","Puncion ventricular",null,1,"D",99,"A","4","A"]
[13986,"70260","Radiografia de craneo; cuatro placas",null,1,"D",99,"A","4","A"]
[13987,"70250","Radiografia de craneo; menos de cuatro placas",null,1,"D",99,"A","4","A"]
[13988,"71035","Radiografia de decubito lateral con rayo horizontal",null,1,"D",99,"A","4","A"]
[13989,"73550","Radiografia de femur, dos incidencias",null,1,"D",99,"A","4","A"]
[13990,"73590","Radiografia de tibia y perone, dos incidencias",null,1,"D",99,"A","4","A"]
[13991,"D0250","Radiografia extraoral",null,1,"D",99,"A","4","A"]
[13992,"D0270","Radiografia bitewing",null,1,"D",99,"A","4","A"]
[13993,"D0240","Radiografia intraoral oclusal",null,1,"D",99,"A","4","A"]
[13994,"72120","Radiologico de pelvis, minimo 4 incidencias",null,1,"D",99,"A","4","A"]
[13995,"83898","Reaccion en cadena de la polimerasa (PCR)",null,1,"D",99,"A","4","A"]
[13996,"D3110","Recubrimiento pulpar directo",null,1,"D",99,"A","4","A"]
[13997,"D3120","Recubrimiento pulpar indirecto",null,1,"D",99,"A","4","A"]
[13998,"89050","Recuento celular en liquidos corporales varios (excepto sangre)",null,1,"D",99,"A","4","I"]
[13999,"89051","Recuento celular en liquidos corporales, con recuento difererencial (Ej  secrecion cervical)",null,1,"D",99,"A","4","I"]
[14000,"85049","Recuento de plaquetas",null,1,"D",99,"A","4","I"]
[14001,"85045","Recuento de reticulocitos",null,1,"D",99,"A","4","I"]
[14002,"44050","Reduccion de volvulo, intususcepcion, hernia interna, mediante laparotomia",null,1,"D",99,"A","4","A"]
[14003,"25250","Remocion de implante",null,1,"D",99,"A","4","A"]
[14004,"29700","Remocion de yeso",null,1,"D",99,"A","4","A"]
[14005,"57720","Reparacion de cuello uterino, abordaje vaginal","F",10,"A",99,"A","4","A"]
[14006,"57210","Reparacion quirurgica de desgarro",null,1,"D",99,"A","4","A"]
[14007,"19120","Reseccion quirurgica nodulo palpable",null,1,"D",99,"A","4","A"]
[14008,"52601","Reseccion transuretral de prostata (RTU)","M",1,"D",99,"A","4","A"]
[14009,"70551","Resonancia Magnetica Cerebral",null,1,"D",99,"A","4","A"]
[14010,"72159","Resonancia magnetica nuclear RMN de columna vertebral, con o sin contraste",null,1,"D",99,"A","4","A"]
[14011,"D2395","Restauracion compuesta con ionomero de vidrio en piezas dentarias permanentes (2 o mas superficies)",null,1,"D",99,"A","4","A"]
[14012,"D2386","Restauracion con el uso de resina, dos superficies, posterior, permanente",null,1,"D",99,"A","4","A"]
[14013,"D2385","Restauracion con el uso de resina, una superficie, posterior, permanente",null,9,"A",99,"A","4","A"]
[14014,"D2331","Restauraciones fotocurables de dos superficies con resina en piezas dentarias anteriores (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14015,"D2120","Restauracion de dos superficies, con amalgama de plata, en piezas dentarias deciduas (compuesta)",null,13,"A",99,"A","4","A"]
[14016,"D2110","Restauracion de una superficie, con amalgama de plata, en piezas dentarias deciduas (simple)",null,13,"A",99,"A","4","A"]
[14017,"D2332","Restauraciones fotocurables de tres superficies con resina en piezas dentarias anteriores (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14018,"40800","Drenaje de absceso, quiste, hematoma, extirpacion de cuerpo extraõo de vestibulo de la boca, sin complicaciones",null,1,"D",99,"A","4","A"]
[14019,"40801","Drenaje de absceso, quiste, hematoma, extirpacion de cuerpo extraõo de vestibulo de la boca, con complicaciones",null,1,"D",99,"A","4","A"]
[14020,"40490","Biopsia de labio",null,1,"D",99,"A","4","A"]
[14021,"42409","Marsupializacion de quiste salival sublingual (ranula)",null,1,"D",99,"A","4","A"]
[14022,"D7174","Enucleacion de ranula",null,1,"D",99,"A","4","A"]
[14023,"D7158","Enucleacion de quiste intraoral (- de 4cm)",null,1,"D",99,"A","4","A"]
[14024,"D7160","Enucleacion de quiste intraoral (+ de 4cm)",null,1,"D",99,"A","4","A"]
[14025,"40808","Biopsia de vestibulo de la boca",null,1,"D",99,"A","4","A"]
[14026,"41100","Biopsia de lengua, dos tercios anteriores",null,10,"A",99,"A","4","A"]
[14027,"41105","Biopsia de lengua, tercio posterior",null,1,"D",99,"A","4","A"]
[14028,"41108","Biopsia de piso de la boca",null,1,"D",99,"A","4","A"]
[14029,"42100","Biopsia de paladar, uvula",null,1,"D",99,"A","4","A"]
[14030,"42400","Biopsia de glandula salival, aguja",null,10,"A",99,"A","4","A"]
[14031,"42405","Biopsia de glandula salival; Incisional",null,1,"D",99,"A","4","A"]
[14032,"41000","Incision intraoral y drenaje de absceso, quiste o hematoma de lengua o piso de la boca; plano superficial",null,1,"D",99,"A","4","A"]
[14033,"41005","Incision intraoral y drenaje de absceso, quiste o hematoma sublingual superficial",null,1,"D",99,"A","4","A"]
[14034,"41006","Incision intraoral y drenaje de absceso, quiste o hematoma de lengua o piso de la boca; plano profundo",null,1,"D",99,"A","4","A"]
[14035,"41007","Incision intraoral y drenaje de absceso, quiste o hematoma del espacio submentoniano",null,1,"D",99,"A","4","A"]
[14036,"41008","Incision intraoral y drenaje de absceso, quiste o hematoma del espacio submandibular",null,1,"D",99,"A","4","A"]
[14037,"41009","Incision intraoral y drenaje de absceso, quiste o hematoma del espacio masticador",null,1,"D",99,"A","4","A"]
[14038,"D2335","Restauraciones fotocurables de cuatro o mas superficies con resina en piezas dentarias anteriores, puede incluir angulo incisal (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14039,"D2390","Restauracion fotocurable de resina en toda la corona de piezas anteriores (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14040,"D2391","Restauracion fotocurable de una superficie con resina en piezas dentarias posterior (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14041,"D2392","Restauraciones fotocurables de dos superficies con resina en piezas dentarias posteriores (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14042,"D2336","Restauracion de piezas dentarias deciduas, anteriores, mediante coronas de composite basado en resinas",null,1,"D",99,"A","4","A"]
[14043,"D2337","Restauracion de piezas dentarias permanentes, anteriores, mediante coronas de composite basado en resinas",null,1,"D",99,"A","4","A"]
[14044,"D2160","Restauraciones de tres superficies con amalgama en piezas dentarias, primarias o permanentes",null,1,"D",99,"A","4","A"]
[14045,"D2140","Restauracion de una superficie con amalgama en piezas dentarias, primarias o permanentes",null,1,"D",99,"A","4","A"]
[14046,"D2380","Restauracion de una superficie, con resina, en piezas dentarias deciduas, posteriores (simple)",null,1,"D",99,"A","4","A"]
[14047,"D2150","Restauracion de dos superficies con amalgama en piezas dentarias, primarias o permanentes",null,1,"D",99,"A","4","A"]
[14048,"D2130","Restauracion de tres superficies, con amalgama de plata, en piezas dentarias deciduas (compleja)",null,1,"D",99,"A","4","A"]
[14049,"D2381","Restauracion de dos superficies, con resina, en piezas dentarias deciduas, posteriores (compuesta)",null,1,"D",99,"A","4","A"]
[14050,"D2382","Restauracion de tres o mas superficies, con resina, en piezas dentarias deciduas, posteriores (compleja)",null,1,"D",99,"A","4","A"]
[14051,"D2387","Restauracion de tres superficies, con resina, en piezas dentarias permanentes, posteriores (compleja)",null,1,"D",99,"A","4","A"]
[14052,"59899","Reversion uterino manual","F",10,"A",99,"A","4","A"]
[14053,"73220","RMN de miembro superior s/contraste",null,1,"D",99,"A","4","A"]
[14054,"59150","Salpingostomia laparoscopica",null,1,"D",99,"A","4","A"]
[14055,"59121","Salpingostomia, abordaje abdominal",null,1,"D",99,"A","4","A"]
[14056,"59151","Salpinguectomia laparoscopica",null,1,"D",99,"A","4","A"]
[14057,"59120","Salpinguectomia, abordaje abdominal",null,1,"D",99,"A","4","A"]
[14058,"82270","Sangre oculta en heces, 1-3 determinaciones",null,1,"D",99,"A","4","A"]
[14059,"84466","Saturacion de transferrina",null,1,"D",99,"A","4","I"]
[14060,"80100","Screening para drogas.",null,1,"D",99,"A","4","I"]
[14061,"86631","Serologia para Chlamydia",null,1,"D",99,"A","4","I"]
[14062,"97113","Sesion: Hidroterapia: tanque de Whirlpool +  procedimiento terapeutico (Kinesioterapia)",null,1,"D",99,"A","4","A"]
[14063,"97139","Sesion: Procedimiento terapeutico (Kinesioterapia) + agentes fisicos",null,1,"D",99,"A","4","A"]
[14064,"84295","Sodio serico",null,1,"D",99,"A","4","A"]
[14065,"C7002","Supervision",null,0,"0",0,"0","2","A"]
[14066,"84376","Sustancias reductoras",null,1,"D",99,"A","4","A"]
[14067,"72128","TAC de columna vertebral",null,1,"D",99,"A","4","A"]
[14068,"71250","TAC de torax, sin contraste",null,1,"D",99,"A","4","A"]
[14069,"80099","Tamizaje neonatal: (Hipotiroidismo congenito, Hiperplasia suprarrenal, Fenilcetonuria, Fibrosis quistica)",null,0,"0",0,"0","2","A"]
[14070,"D9110","Anestesia local no en combinacion con procedimientos quirurgicos",null,1,"D",99,"A","4","A"]
[14071,"99499","Telemedicina",null,1,"D",99,"A","4","A"]
[14072,"27000","Tenotomia del aductor",null,1,"D",99,"A","4","A"]
[14073,"27005","Tenotomia del psoas",null,1,"D",99,"A","4","A"]
[14074,"97802","Terapia de nutricion medica (Nutricion parenteral)",null,1,"D",99,"A","4","A"]
[14075,"92507","Terapia del lenguaje",null,1,"D",99,"A","4","A"]
[14076,"97010","Terapia fisica a una o mas areas; frio o calor local",null,1,"D",99,"A","4","A"]
[14077,"79005","Terapia radiofarmaceutica, via endovenosa",null,1,"D",99,"A","4","A"]
[14078,"83662","Test de Clements Lecitina-esfingomielina,",null,1,"D",99,"A","4","A"]
[14079,"86880","Test de Coombs directo",null,1,"D",99,"A","4","A"]
[14080,"86886","Test de Coombs indirecto",null,1,"D",99,"A","4","A"]
[14081,"81025","Test de embarazo en orina",null,1,"D",99,"A","4","A"]
[14082,"59020","Test de estres fetal",null,10,"A",55,"A","4","A"]
[14083,"89060","Test de Fern (hoja de helecho)",null,1,"D",99,"A","4","I"]
[14084,"87172","Test de Graham",null,1,"D",99,"A","4","A"]
[14085,"85460","Test de Kleihauer-Betske",null,1,"D",99,"A","4","I"]
[14086,"89240","Test de Laneta",null,1,"D",99,"A","4","I"]
[14087,"59025","Test no estresante",null,10,"A",55,"A","4","A"]
[14088,"84402","Testosterona",null,1,"D",99,"A","4","I"]
[14089,"84450","TGO transaminasa glutamico oxaclacetica",null,1,"D",99,"A","4","A"]
[14090,"84460","TGP transaminsa glutamico piruvica",null,1,"D",99,"A","4","A"]
[14091,"85610","Tiempo de protrombina",null,1,"D",99,"A","4","I"]
[14092,"85730","Tiempo parcial de tromboplastina",null,1,"D",99,"A","4","I"]
[14093,"87209","Tincion especial compleja para huevos y parasitos",null,1,"D",99,"A","4","I"]
[14094,"81007","Tira reactiva para bacteriuria",null,1,"D",99,"A","4","A"]
[14095,"84510","Tirosina (T4)",null,1,"D",99,"A","4","I"]
[14096,"84442","Tirosina ligada a globulina (TBG)",null,1,"D",99,"A","4","I"]
[14097,"84439","Tiroxina; libre",null,1,"D",99,"A","4","I"]
[14098,"74150","Tomografia Computada de Abdomen sin contraste",null,1,"D",99,"A","4","A"]
[14099,"70450","Tomografia Computada de Cerebro sin contraste",null,1,"D",99,"A","4","A"]
[14100,"72192","Tomografia Computada de Pelvis sin contraste",null,1,"D",99,"A","4","A"]
[14101,"90702","Toxoides absorbidos del tetanos y de la difteria, (DT)",null,1,"D",99,"A","4","I"]
[14102,"66170","Trabeculectomia",null,1,"D",99,"A","4","A"]
[14103,"27299","Traccion cutanea",null,1,"D",99,"A","4","A"]
[14104,"20650","Traccion esqueletica",null,1,"D",99,"A","4","A"]
[14105,"36430","Transfusion de sangre o componentes sanguineos",null,1,"D",99,"A","4","A"]
[14106,"36460","Transfusion intrauterina","F",1,"D",99,"A","4","A"]
[14107,"31603","Traqueostomia",null,1,"D",99,"A","4","A"]
[14108,"27217","Tratamiento abierto de de fractura pelvica y/o luxacion, incluye fijacion interna",null,1,"D",99,"A","4","A"]
[14109,"27226","Tratamiento abierto de fractura acetabular",null,1,"D",99,"A","4","A"]
[14110,"24685","Tratamiento abierto de fractura de olecranon",null,1,"D",99,"A","4","A"]
[14111,"27822","Tratamiento abierto de fractura de tobillo",null,1,"D",99,"A","4","A"]
[14112,"25515","Tratamiento abierto de fractura radial, incluye fijacion interna",null,1,"D",99,"A","4","A"]
[14113,"27258","Tratamiento abierto de luxacion de cadera (congenita o patologica), por reemplazo de cabeza femoral (incluye tenotomia)",null,1,"D",99,"A","4","A"]
[14114,"23500","Tratamiento cerrado de fractura de clavicula sin manipulacion.",null,1,"D",99,"A","4","A"]
[14115,"28490","Tratamiento cerrado de fractura de dedo gordo, falange o falanges; sin manipulacion",null,10,"A",0,null,"4","A"]
[14116,"25630","Tratamiento cerrado de fractura de hueso carpiano; excepto escafoide",null,1,"D",99,"A","4","A"]
[14117,"28450","Tratamiento cerrado de fractura de hueso tarsiano (excepto astragalo y calcaneo) o metatarsiano",null,1,"D",99,"A","4","A"]
[14118,"23600","Tratamiento cerrado de fractura de humero proximal",null,1,"D",99,"A","4","A"]
[14119,"25500","Tratamiento cerrado de fractura radial o ulnar",null,1,"D",99,"A","4","A"]
[14120,"25505","Tratamiento cerrado de fractura radial o ulnar, con manipulacion",null,1,"D",99,"A","4","A"]
[14121,"27750","Tratamiento cerrado de fractura tibial",null,1,"D",99,"A","4","A"]
[14122,"27500","Tratamiento cerrado de frsctura femoral, sin manipulacion",null,1,"D",99,"A","4","A"]
[14123,"23540","Tratamiento cerrado de luxacion de hombro",null,1,"D",99,"A","4","A"]
[14124,"27552","Tratamiento cerrado de luxacion de rodilla, con anestesia",null,1,"D",99,"A","4","A"]
[14125,"27550","Tratamiento cerrado de luxacion de rodilla, sin anestesia",null,1,"D",99,"A","4","A"]
[14126,"D3321","Tratamiento de Conducto de Pieza bicuspide No Vital",null,1,"D",99,"A","4","A"]
[14127,"D3320","Terapia endodontica en piezas dentarias bicuspideas vitales",null,1,"D",99,"A","4","A"]
[14128,"D3331","Tratamiento de la obstruccion del conducto radicular, acceso no quirurgico",null,1,"D",99,"A","4","A"]
[14129,"D3330","Terapia endodontica en piezas dentarias posteriores vitales",null,1,"D",99,"A","4","A"]
[14130,"D3311","Tratamiento de Conducto en pieza Uniradicular No Vital",null,1,"D",99,"A","4","A"]
[14131,"D3310","Terapia endodontica en piezas dentarias anteriores vitales",null,1,"D",99,"A","4","A"]
[14132,"25526","Tratamiento de fractura radial y radial ulnar",null,1,"D",99,"A","4","A"]
[14133,"27257","Tratamiento de la luxacion de cadera (congenuta o patologica) por abduccion, ferula o traccion, con manipulacion y que requiere anestesia",null,1,"D",99,"A","4","A"]
[14134,"27256","Tratamiento de la luxacion de cadera (congenuta o patologica) por abduccion, ferula o traccion, sin manipulacion",null,1,"D",99,"A","4","A"]
[14135,"16000","Tratamiento local de quemadura de primer grado",null,1,"D",99,"A","4","A"]
[14136,"94640","Tratamiento por inhalacion con o sin presion",null,1,"D",99,"A","4","A"]
[14137,"61107","Trepanacion para implantar cateter",null,1,"D",1,"D","4","A"]
[14138,"88478","Trigliceridos",null,1,"D",99,"A","4","A"]
[14139,"84480","Triyodotironina (T3)",null,1,"D",99,"A","4","I"]
[14140,"84481","Triyodotironina T3; libre",null,1,"D",99,"A","4","I"]
[14141,"84512","Troponina",null,1,"D",99,"A","4","I"]
[14142,"32551","Tubo de toracostomia cerrada, incluye sello de agua",null,1,"D",99,"A","4","I"]
[14143,"76811","Ultrasonido de utero gravido y evaluacion fetal detallada",null,1,"D",99,"A","4","A"]
[14144,"76510","Ultrasonido oftalmico, ecografia, diagnostico.",null,1,"D",99,"A","4","A"]
[14145,"84520","Urea",null,1,"D",99,"A","4","I"]
[14146,"87086","Urocultivo con recuento de colonias",null,1,"D",99,"A","4","I"]
[14147,"74400","Urografia excretoria",null,1,"D",99,"A","4","A"]
[14148,"74420","Urografia retrograda",null,1,"D",99,"A","4","A"]
[14149,"90713","Vacuna Antipolio (IPV) uso IM",null,2,"M",10,"A","4","A"]
[14150,"90712","Vacuna Antipolio, uso oral (APO)",null,2,"M",10,"A","4","A"]
[14151,"90675","Vacuna antirrabica, uso IM (CRL)",null,1,"M",99,"I","4","A"]
[14152,"90676","Vacuna antirrabica, uso intradermico",null,1,"M",99,"A","4","A"]
[14153,"90717","Vacuna contra la Fiebre Amarilla,uso IM",null,1,"A",99,"A","4","A"]
[14154,"90657","Vacuna de Influenza, para uso IM",null,7,"M",99,"A","4","A"]
[14155,"90701","Vacuna DPT, uso IM",null,1,"A",5,"A","4","A"]
[14156,"90744","Vacuna para Hepatitis B",null,1,"D",99,"A","4","A"]
[14157,"90669","Vacuna para neumococo, heptavalente",null,2,"M",10,"A","4","A"]
[14158,"90681","Vacuna para Rotavirus",null,2,"M",7,"M","4","A"]
[14159,"90649","Vacuna para Virus Papiloma (VPH)","F",9,"A",15,"A","4","A"]
[14160,"90707","Vacuna SPR",null,1,"A",5,"A","4","A"]
[14161,"90708","Vacuna SR",null,1,"A",99,"A","4","A"]
[14162,"90585","Vacuna BCG",null,1,"D",5,"A","4","A"]
[14163,"90723","Vacunas Pentavalente (DPT+ Hib + HvB)",null,2,"M",5,"A","4","A"]
[14164,"55250","Vasectomia, incluye examenes de semen posteriores","M",20,"A",99,"A","4","I"]
[14165,"85651","Velocidad de Sedimentacion Globular",null,1,"D",99,"A","4","A"]
[14166,"29240","Vendaje de hombro (Velpeau)",null,1,"D",99,"A","4","A"]
[14167,"67005","Vitrectomia anterior",null,1,"D",99,"A","4","A"]
[14168,"83719","VLDL Colesterol",null,1,"D",99,"A","4","A"]
[14170,"C8002","Plan de Atencion integral",null,1,"D",99,"A","4","A"]
[14171,"87621","Test PVH (Toma de muestra)","F",10,"A",99,"A","7","A"]
[14172,"41015","Incision extraoral para drenaje de absceso, quiste o hematoma; espacio sublingual, submentoniano, submandibular",null,1,"D",99,"A","4","A"]
[14173,"41016","Incision extraoral para drenaje de absceso, quiste o hematoma de espacio submentoniano",null,1,"D",99,"A","4","A"]
[14174,"41017","Incision extraoral para drenaje de absceso, quiste o hematoma de espacio submandibular .",null,1,"D",99,"A","4","A"]
[14175,"41018","Incision extraoral y drenaje de absceso, quiste o hematoma del piso de la boca; espacio masticador",null,1,"D",99,"A","4","A"]
[14176,"41800","Drenaje de absceso, quiste, hematoma de las estructuras dentoalveolares .",null,1,"D",99,"A","4","A"]
[14177,"42305","Drenaje complicado  de absceso de glandula parotida",null,1,"D",99,"A","4","A"]
[14178,"42310","Drenaje intraoral de absceso de glandula submaxilar o sublingual",null,1,"D",99,"A","4","A"]
[14179,"42320","Drenaje de absceso de glandula submaxilar externa",null,1,"D",99,"A","4","A"]
[14180,"D1511","Instalacion de mantenedor de espacio fijo unilateral",null,9,"A",99,"A","4","A"]
[14181,"D1526","Instalacion  de mantenedor de espacio removible",null,9,"A",99,"A","4","A"]
[14182,"D2510","Inlay metalica de una superficie",null,10,"A",99,"A","4","A"]
[14183,"D2542","Onlay metalico de dos superficies",null,10,"A",99,"A","4","A"]
[14184,"D2610","Inlay de ceramica de porcelana una superficie",null,10,"A",99,"A","4","A"]
[14185,"D2642","Onlay de ceramica de porcelana de dos superficies",null,10,"A",99,"A","4","A"]
[14186,"D2650","Incrustaciones inlay de resina de una superficie",null,10,"A",99,"A","4","A"]
[14187,"D2662","Onlay de resina compuesta de dos superficies",null,10,"A",99,"A","4","A"]
[14188,"D2930","Corona prefabricada de acero diente primario",null,10,"A",99,"A","4","A"]
[14189,"D2951","Pin de retencion por diente",null,10,"A",99,"A","4","A"]
[14190,"D2955","Remocion de poste",null,10,"A",99,"A","4","A"]
[14191,"D2971","Reparacion de la corona",null,10,"A",99,"A","4","A"]
[14192,"D2972","Restauracion con carilla de resina - por pieza dentaria",null,10,"A",99,"A","4","A"]
[14193,"D3430","Obturacion retrograda por raiz",null,9,"A",99,"A","4","A"]
[14194,"D5111","Protesis dental completa inmediata - por maxilar",null,10,"A",99,"A","4","A"]
[14195,"D5212","Protesis removible parcial mandibular base de acrilico (termocurado)",null,10,"A",99,"A","4","A"]
[14196,"D5710","Rebase de protesis maxilar completa",null,10,"A",99,"A","4","A"]
[14197,"D5810","Protesis completa maxilar provisional",null,10,"A",99,"A","4","A"]
[14198,"D5811","Protesis completa mandibular provisional",null,10,"A",99,"A","4","A"]
[14199,"D5850","Acondicionamiento del tejido maxilar",null,10,"A",99,"A","4","A"]
[14200,"D5875","Modificacion de la protesis removible siguiendo la cirugia de implantes",null,10,"A",99,"A","4","A"]
[14201,"D5931","Obturador protesico por cirugia",null,10,"A",99,"A","4","A"]
[14202,"D5932","Protesis para obturacion definitiva",null,10,"A",99,"A","4","A"]
[14203,"D5937","Aparato para trismo",null,10,"A",99,"A","4","A"]
[14204,"D7130","Biopsia por excision de tejido blando de cavidad oral (todo tejido blando)",null,10,"A",99,"A","4","A"]
[14205,"D7132","Biopsia de tejido duro de cavidad oral (hueso, dientes)",null,10,"A",99,"A","4","A"]
[14206,"D7152","Drenaje de hematoma en cavidad oral",null,1,"D",99,"A","4","A"]
[14207,"D7154","Drenaje intraoral de absceso odontogenico",null,1,"D",99,"A","4","A"]
[14208,"D7156","Drenaje extraoral de absceso facial odontogenico",null,1,"D",99,"A","4","A"]
[14209,"D7164","Excision de mucocele",null,1,"D",99,"A","4","A"]
[14210,"D8070","Tratamiento de ortodoncia integral en denticion mixta",null,9,"A",99,"A","4","A"]
[14211,"D8071","Tratamiento de Ortodoncia para Maloclusion Clase II Division 1 en denticion permanente",null,9,"A",99,"A","4","A"]
[14212,"D8072","Tratamiento de Ortodoncia para maloclusion Clase III en denticion Permanente",null,9,"A",99,"A","4","A"]
[14213,"D8073","Tratamiento combinado ortodoncico quirurgico - Fase Ortodoncico Prequirurgica",null,9,"A",99,"A","4","A"]
[14214,"D8074","Tratamiento combinado ortodoncico quirurgico - Fase Ortodoncico Postquirurgica",null,9,"A",99,"A","4","A"]
[14215,"D8210","Terapia con aparatologia en ortodoncia removible",null,9,"A",99,"A","4","A"]
[14216,"D8211","Tratamiento de Ortopedia para maloclusiones en desarrollo en denticion decidua",null,9,"A",99,"A","4","A"]
[14217,"D8660","Visita - pre tratamiento de ortodoncia",null,9,"A",99,"A","4","A"]
[14218,"D8662","Tratamiento combinado de ortodoncia y ortopedia para  mordidas abiertas en denticion mixta",null,9,"A",99,"A","4","A"]
[14219,"D8661","Tratamiento combinado de ortodoncia y ortopedia para mordidas profundas en denticion mixta",null,9,"A",99,"A","4","A"]
[14220,"D8663","Tratamiento combinado de ortodoncia y ortopedia para maloclusiones en desarrollo en denticion mixta",null,9,"A",99,"A","4","A"]
[14221,"C8001","Entrega de canastas",null,1,"D",99,"A","4","A"]
[14222,"92225","Oftalmoscopia indirecta",null,1,"D",99,"A","4","A"]
[14223,"D7246","Reimplante Fijado con Resina",null,1,"D",99,"A","4","A"]
[14227,"D0290","Radiografia postero - anterior o lateral de craneo y huesos faciales",null,1,"D",99,"A","4","A"]
[14228,"D0310","Sialografia",null,1,"D",99,"A","4","A"]
[14229,"D0322","Estudio tomografico",null,1,"D",99,"A","4","A"]
[14230,"D0330","Radiografia panoramica",null,1,"D",99,"A","4","A"]
[14231,"D0340","Radiografia cefalometrica",null,1,"D",99,"A","4","A"]
[14232,"D0321","Otras radiografias de la articulacion temporomandibular con informe",null,1,"D",99,"A","4","A"]
[14233,"D0350","Imagenes fotografica oral y facial",null,1,"D",99,"A","4","A"]
[14234,"D0415","Recoleccion de muestra de microorganismo para cultivo y prueba de sensibilidad",null,1,"D",99,"A","4","A"]
[14235,"D0416","Cultivo viral",null,1,"D",99,"A","4","A"]
[14236,"D0425","Pruebas de susceptibilidad de la caries",null,1,"D",99,"A","4","A"]
[14237,"D0460","Pruebas de vitalidad de la pulpa",null,1,"D",99,"A","4","A"]
[14238,"D0470","Impresiones dentales para diagnostico",null,1,"D",99,"A","4","A"]
[14239,"D1204","Aplicacion topica de fluor gel",null,1,"D",99,"A","4","A"]
[14240,"D1206","Aplicacion de fluor barniz",null,1,"D",99,"A","4","A"]
[14241,"D1310","Asesoria nutricional para el control de enfermedades dentales",null,1,"D",99,"A","4","A"]
[14242,"D1330","Instruccion de higiene oral (IHO)",null,1,"D",99,"A","4","A"]
[14243,"E1311","Raspaje dental o destartraje dental",null,1,"D",99,"A","4","A"]
[14244,"E1352","Tecnica de restauracion atraumatica",null,1,"D",99,"A","4","A"]
[14245,"D1510","Mantenedor de espacio fijo unilateral",null,1,"D",99,"A","4","A"]
[14246,"D1515","Mantenedor de espacio fijo bilateral",null,1,"D",99,"A","4","A"]
[14247,"D1520","Mantenedor de espacio removible unilateral",null,1,"D",99,"A","4","A"]
[14248,"D1525","Mantenedor de espacio removible bilateral",null,1,"D",99,"A","4","A"]
[14249,"D1550","Re-cementacion de mantenedor de espacio",null,1,"D",99,"A","4","A"]
[14250,"D1555","Remocion de mantenedor de espacio fijo por el dentista que no lo coloco",null,1,"D",99,"A","4","A"]
[14251,"D2161","Restauraciones de cuatro superficies con amalgama en piezas dentarias, primarias o permanentes",null,1,"D",99,"A","4","A"]
[14252,"E2336","Restauracion autocurable de una superficie con resina en piezas dentarias anteriores (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14253,"E2337","Restauraciones autocurables de dos superficies con resina en piezas dentarias anteriores (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14254,"E2338","Restauraciones autocurables de tres superficies con resina en piezas dentarias anteriores (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14255,"E2339","Restauraciones autocurables de cuatro o mas superficies con resina en piezas dentarias anteriores, puede incluir angulo incisal (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14256,"E2340","Restauracion autocurable de una superficie con resina en piezas dentarias posteriores (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14257,"E2341","Restauraciones autocurables de dos superficies con resina en piezas dentarias posteriores (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14258,"E2342","Restauraciones autocurables de tres superficies con resina en piezas dentarias posteriores (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14259,"E2343","Restauraciones autocurables de cuatro o mas superficies con resina en piezas dentarias posteriores  (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14260,"D2393","Restauraciones fotocurables de tres superficies con resina en piezas dentarias posteriores (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14261,"D2394","Restauraciones fotocurables de cuatro superficies o mas con resina en piezas dentarias posteriores (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14262,"E2395","Restauracion fotocurable con ionomero de vidrio en una superficie dentaria (primaria o permanente)",null,1,"D",99,"A","4","A"]
[14263,"E2396","Restauracion fotocurable con ionomero de vidrio en dos superficies dentarias (primaria o permanente)",null,1,"D",99,"A","4","A"]
[14264,"E2397","Restauracion fotocurable con ionomero de vidrio en tres superficies dentarias (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14265,"E2398","Restauracion autocurable con ionomero de vidrio en una superficie dentaria (primaria o permanente)",null,1,"D",99,"A","4","A"]
[14266,"E2399","Restauracion autocurable con ionomero de vidrio en dos superficies dentarias (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14267,"E2400","Restauracion autocurable  con ionomero de vidrio en tres superficies dentarias (primarias o permanentes)",null,1,"D",99,"A","4","A"]
[14268,"D2520","Inlay metalica de dos superficies",null,1,"D",99,"A","4","A"]
[14269,"D2530","Inlay metalico de tres superficies",null,1,"D",99,"A","4","A"]
[14270,"D2543","Onlay metalico de tres superficies",null,1,"D",99,"A","4","A"]
[14271,"D2544","Onlay metalico de cuatro a mas superficies",null,1,"D",99,"A","4","A"]
[14272,"D2651","Incrustaciones inlay de resina de dos superficies",null,1,"D",99,"A","4","A"]
[14273,"D2652","Incrustaciones inlay de resina de tres o mas superficies",null,1,"D",99,"A","4","A"]
[14274,"D2663","Onlay de resina compuesta de tres superficies",null,1,"D",99,"A","4","A"]
[14275,"D2664","Onlay de resina compuesta de cuatro a mas superficies",null,1,"D",99,"A","4","A"]
[14276,"D2620","Inlay de ceramica de porcelana dos superficies",null,1,"D",99,"A","4","A"]
[14277,"D2630","Inlay de ceramica de porcelana tres a mas superficies",null,1,"D",99,"A","4","A"]
[14278,"D2643","Onlay de ceramica de porcelana de tres superficies",null,1,"D",99,"A","4","A"]
[14279,"D2644","Onlay de ceramica de porcelana de cuatro a mas superficies",null,1,"D",99,"A","4","A"]
[14280,"D2710","Corona de base de acrilico (indirecta)",null,1,"D",99,"A","4","A"]
[14281,"D2712","Corona de base de acrilico 3/4 de corona  (indirecta)",null,1,"D",99,"A","4","A"]
[14282,"D2721","Corona de acrilico predominantemente de metal base",null,1,"D",99,"A","4","A"]
[14283,"D2740","Corona de porcelana",null,1,"D",99,"A","4","A"]
[14284,"D2751","Corona de porcelana base de metal",null,1,"D",99,"A","4","A"]
[14285,"D2781","Corona de 3/4 de metal base",null,1,"D",99,"A","4","A"]
[14286,"D2783","Corona 3/4 de porcelana (no incluye carillas faciales)",null,1,"D",99,"A","4","A"]
[14287,"D2791","Corona de metal base",null,1,"D",99,"A","4","A"]
[14288,"D2794","Corona de titanio",null,1,"D",99,"A","4","A"]
[14289,"D2799","Corona provisional",null,1,"D",99,"A","4","A"]
[14290,"D2910","Re-cementacion de inlay y onlay o cementacion parcial",null,1,"D",99,"A","4","A"]
[14291,"D2915","Re-cementacion de poste prefabricado",null,1,"D",99,"A","4","A"]
[14292,"D2920","Re-cementacion de corona",null,1,"D",99,"A","4","A"]
[14293,"D2931","Corona prefabricada de acero diente permanente",null,1,"D",99,"A","4","A"]
[14294,"D2932","Corona prefabricada de acrilico",null,1,"D",99,"A","4","A"]
[14295,"D2933","Corona de acero inoxidable prefabricado con frente estetico de acrilico",null,1,"D",99,"A","4","A"]
[14296,"D2934","Corona de acero inoxidable prefabricado con revestimiento estetico - diente primario",null,1,"D",99,"A","4","A"]
[14297,"D2940","Relleno sedante (eugenato)",null,1,"D",99,"A","4","A"]
[14298,"D2950","Reconstruccion de mu¤ones, incluyendo los pines",null,1,"D",99,"A","4","A"]
[14299,"D2954","Poste prefabricado y nucleo adicional por cada diente",null,1,"D",99,"A","4","A"]
[14300,"D2952","Realizacion de poste y mu¤on para la corona",null,1,"D",99,"A","4","A"]
[14301,"D2960","Carilla labial de resina directa",null,1,"D",99,"A","4","A"]
[14302,"D2961","Carillas labiales de resina indirecta",null,1,"D",99,"A","4","A"]
[14303,"D2962","Carillas labiales de porcelana",null,1,"D",99,"A","4","A"]
[14304,"D2999","Procedimiento de restauracion no especifica, con informe",null,1,"D",99,"A","4","A"]
[14305,"D3221","Apertura cameral",null,1,"D",99,"A","4","A"]
[14306,"D3222","Pulpotomia parcial para Apexogenesis",null,1,"D",99,"A","4","A"]
[14307,"E3319","Terapia endodontica en piezas dentarias anteriores no vitales",null,1,"D",99,"A","4","A"]
[14308,"E3321","Terapia endodontica en piezas dentarias bicuspideas no vitales",null,1,"D",99,"A","4","A"]
[14309,"E3322","Terapia endodontica en piezas dentarias posteriores no vitales",null,1,"D",99,"A","4","A"]
[14310,"D3332","Terapia endodontica incompleta, diente inoperable, sin posibilidad de restauracion o fracturado",null,1,"D",99,"A","4","A"]
[14311,"D3333","Reparacion de la raiz interna por defectos de perforacion",null,1,"D",99,"A","4","A"]
[14312,"D3346","Retratamiento de endodoncia en piezas dentaria anteriores",null,1,"D",99,"A","4","A"]
[14313,"D3347","Retratamiento de endodoncia en piezas dentarias bicuspideas",null,1,"D",99,"A","4","A"]
[14314,"D3348","Retratamiento de endodoncia de piezas dentarias posteriores",null,1,"D",99,"A","4","A"]
[14315,"D3352","Apexificacion remplazo de medicacion provisional",null,1,"D",99,"A","4","A"]
[14316,"D3410","Apicectomia/cirugia periapical en piezas anteriores",null,1,"D",99,"A","4","A"]
[14317,"D3421","Apicectomia/cirugia periapical en piezas bicuspideas",null,1,"D",99,"A","4","A"]
[14318,"D3425","Apicectomia/cirugia periapical en piezas posteriores",null,1,"D",99,"A","4","A"]
[14319,"D3450","Amputacion radicular",null,1,"D",99,"A","4","A"]
[14320,"D3460","Implante endodontico endooseo",null,1,"D",99,"A","4","A"]
[14321,"D3470","Reimplantacion intencional incluyendo ferulizacion",null,1,"D",99,"A","4","A"]
[14322,"D3920","Hemiseccion (incluyendo cualquier remocion de raiz), sin incluir la terapia de conducto radicular",null,1,"D",99,"A","4","A"]
[14323,"D3999","Procedimiento endodontico no especificado, por informe",null,1,"D",99,"A","4","A"]
[14324,"E4110","Pulido dental",null,1,"D",99,"A","4","A"]
[14325,"E4120","Raspaje y pulido dental",null,1,"D",99,"A","4","A"]
[14326,"E4130","Curetaje subgingival",null,1,"D",99,"A","4","A"]
[14327,"D4341","Raspado y alisado radicular - cuatro a mas dientes por cuadrante",null,1,"D",99,"A","4","A"]
[14328,"D4342","Raspado y alisado radicular de uno a tres dientes por cuadrante",null,1,"D",99,"A","4","A"]
[14329,"D4211","Gingivectomia - gingivoplastia de 1 a 3 dientes contiguos o espacios dentales vecinos por cuadrante o sextantes",null,1,"D",99,"A","4","A"]
[14330,"D4240","Colgajo periodontal con alisado radicular de 4 a mas dientes contiguos o espacios dentales vecinos por cuadrante",null,1,"D",99,"A","4","A"]
[14331,"D4245","Colgajo posicionado apicalmente",null,1,"D",99,"A","4","A"]
[14332,"D4249","Alargamiento clinico de corona",null,1,"D",99,"A","4","A"]
[14333,"E4250","Cirugia periodontal receptiva por cuadrante",null,1,"D",99,"A","4","A"]
[14334,"E4251","Cirugia periodontal receptiva por sextante",null,1,"D",99,"A","4","A"]
[14335,"D4266","Regeneracion tisular guiada - barrera absorbible sin relleno",null,1,"D",99,"A","4","A"]
[14336,"E4252","Regeneracion tisular guiada - barrera absorbible con relleno",null,1,"D",99,"A","4","A"]
[14337,"D4267","Regeneracion tisular guiada - barrera no absorbible sin relleno",null,1,"D",99,"A","4","A"]
[14338,"E4253","Regeneracion tisular guiada - barrera no absorbible con relleno",null,1,"D",99,"A","4","A"]
[14339,"D4268","Correcciones post quirurgicas",null,1,"D",99,"A","4","A"]
[14340,"D4270","Colgajo desplazado de tejido blando",null,1,"D",99,"A","4","A"]
[14341,"D4271","Injerto gingival libre (incluye cirugia de la zona donante)",null,1,"D",99,"A","4","A"]
[14342,"D4273","Injerto de tejido conectivo subepitelial (incluye cirugia de la zona donante)",null,1,"D",99,"A","4","A"]
[14343,"D4274","Cu¤a distal o proximal (cuando no se realiza en conjuncion con procedimientos quirurgicos en la misma area anatomica",null,1,"D",99,"A","4","A"]
[14344,"D4275","Aloinjerto de tejido blando",null,1,"D",99,"A","4","A"]
[14345,"D4320","Ferulizacion provisional intracoronal",null,1,"D",99,"A","4","A"]
[14346,"D4321","Ferulizacion provisional extracoronal",null,1,"D",99,"A","4","A"]
[14347,"D4381","Medicacion antimicrobiana de uso local controlada",null,1,"D",99,"A","4","A"]
[14348,"D4910","Mantenimiento periodontal",null,1,"D",99,"A","4","A"]
[14349,"D4999","Procedimiento periodontal no especificado, por informe",null,1,"D",99,"A","4","A"]
[14350,"E5010","Regeneracion osea",null,1,"D",99,"A","4","A"]
[14351,"E5011","Colgajo desplazado con injerto de tejido conectivo",null,1,"D",99,"A","4","A"]
[14352,"E5012","Injerto oseo",null,1,"D",99,"A","4","A"]
[14353,"D5120","Protesis dental completa mandibular",null,1,"D",99,"A","4","A"]
[14354,"D5130","Protesis inmediata maxilar",null,1,"D",99,"A","4","A"]
[14355,"D5140","Protesis inmediata mandibular",null,1,"D",99,"A","4","A"]
[14356,"D5213","Protesis removible parcial maxilar base metalica",null,1,"D",99,"A","4","A"]
[14357,"D5214","Protesis removible parcial mandibular base metalica",null,1,"D",99,"A","4","A"]
[14358,"D5225","Protesis removible parcial maxilar - base flexible",null,1,"D",99,"A","4","A"]
[14359,"D5226","Protesis removible parcial mandibular - base flexible",null,1,"D",99,"A","4","A"]
[14360,"D5281","Protesis removible parcial unilateral - una pieza moldeada de metal",null,1,"D",99,"A","4","A"]
[14361,"D5410","Ajuste de protesis completa maxilar",null,1,"D",99,"A","4","A"]
[14362,"D5411","Ajuste de protesis completa mandibular",null,1,"D",99,"A","4","A"]
[14363,"D5421","Ajuste de protesis parcial maxilar",null,1,"D",99,"A","4","A"]
[14364,"D5422","Ajuste de protesis parcial mandibular",null,1,"D",99,"A","4","A"]
[14365,"D5510","Reparacion de fractura de base de dentadura completa",null,1,"D",99,"A","4","A"]
[14366,"D5520","Remplazar los dientes perdidos o rotos",null,1,"D",99,"A","4","A"]
[14367,"D5610","Reparacion de protesis parcial de base de acrilico",null,1,"D",99,"A","4","A"]
[14368,"D5620","Reparacion de armazon colado",null,1,"D",99,"A","4","A"]
[14369,"D5630","Reparacion o remplazo de retenedores fracturados",null,1,"D",99,"A","4","A"]
[14370,"D5640","Remplazo de dientes fracturados",null,1,"D",99,"A","4","A"]
[14371,"D5650","A¤adir diente a la protesis parcial existente",null,1,"D",99,"A","4","A"]
[14372,"D5660","Agregar retenedor a la protesis parcial existente",null,1,"D",99,"A","4","A"]
[14373,"D5670","Remplazar todos los dientes y acrilico sobre armazon moldeado de metal",null,1,"D",99,"A","4","A"]
[14374,"D5711","Rebase de protesis mandibular completa",null,1,"D",99,"A","4","A"]
[14375,"D5720","Rebase de protesis maxilar parcial",null,1,"D",99,"A","4","A"]
[14376,"D5721","Rebase de protesis mandibular parcial",null,1,"D",99,"A","4","A"]
[14377,"D5730","Revestimiento de protesis maxilar completa en consultorio",null,1,"D",99,"A","4","A"]
[14378,"D5731","Revestimiento de protesis mandibular completa en consultorio",null,1,"D",99,"A","4","A"]
[14379,"D5740","Revestimiento de protesis parcial maxilar en consultorio",null,1,"D",99,"A","4","A"]
[14380,"D5741","Revestimiento de protesis parcial mandibular en consultorio",null,1,"D",99,"A","4","A"]
[14381,"D5750","Revestimiento de protesis completa maxilar en laboratorio",null,1,"D",99,"A","4","A"]
[14382,"D5751","Revestimiento de protesis completa mandibular en laboratorio",null,1,"D",99,"A","4","A"]
[14383,"D5760","Revestimiento de protesis parcial maxilar en laboratorio",null,1,"D",99,"A","4","A"]
[14384,"D5761","Revestimiento de protesis parcial mandibular en laboratorio",null,1,"D",99,"A","4","A"]
[14385,"D5820","Protesis removible parcial maxilar provisional (curado rapido)",null,1,"D",99,"A","4","A"]
[14386,"D5821","Protesis removible parcial mandibular provisional (curado rapido)",null,1,"D",99,"A","4","A"]
[14387,"D5851","Acondicionamiento del tejido mandibular",null,1,"D",99,"A","4","A"]
[14388,"D5860","Sobredentadura completa",null,1,"D",99,"A","4","A"]
[14389,"D5861","Sobredentadura parcial",null,1,"D",99,"A","4","A"]
[14390,"D5899","Procedimiento sin especificar de protesis removible",null,1,"D",99,"A","4","A"]
[14391,"D5862","Ataches de precision",null,1,"D",99,"A","4","A"]
[14392,"D5911","Mascara facial por secciones",null,1,"D",99,"A","4","A"]
[14393,"D5912","Mascara facial completa",null,1,"D",99,"A","4","A"]
[14394,"D5913","Protesis nasal",null,1,"D",99,"A","4","A"]
[14395,"D5914","Protesis articular",null,1,"D",99,"A","4","A"]
[14396,"D5915","Protesis orbital",null,1,"D",99,"A","4","A"]
[14397,"D5916","Protesis ocular",null,1,"D",99,"A","4","A"]
[14398,"D5919","Protesis facial",null,1,"D",99,"A","4","A"]
[14399,"D5922","Protesis nasal septal",null,1,"D",99,"A","4","A"]
[14400,"D5923","Protesis ocular, con caracter interino",null,1,"D",99,"A","4","A"]
[14401,"D5924","Protesis craneal",null,1,"D",99,"A","4","A"]
[14402,"D5925","Implante de protesis de aumento facial",null,1,"D",99,"A","4","A"]
[14403,"D5926","Sustitucion de protesis nasal",null,1,"D",99,"A","4","A"]
[14404,"D5927","Protesis auricular de remplazo",null,1,"D",99,"A","4","A"]
[14405,"D5928","Protesis orbital de remplazo",null,1,"D",99,"A","4","A"]
[14406,"D5929","Protesis facial de remplazo",null,1,"D",99,"A","4","A"]
[14407,"D5933","Protesis de obturador modificable",null,1,"D",99,"A","4","A"]
[14408,"D5934","Reseccion mandibular protesis con brida guia",null,1,"D",99,"A","4","A"]
[14409,"D5935","Reseccion mandibular protesis sin brida guia",null,1,"D",99,"A","4","A"]
[14410,"D5936","Obturador protesico provisional",null,1,"D",99,"A","4","A"]
[14411,"D5951","Protesis para ayuda de alimentacion",null,1,"D",99,"A","4","A"]
[14412,"D5952","Laringofono protesis pediatrica",null,1,"D",99,"A","4","A"]
[14413,"D5953","Laringofono protesis en adulto",null,1,"D",99,"A","4","A"]
[14414,"D5954","Aumento de protesis palatal",null,1,"D",99,"A","4","A"]
[14415,"D5955","Elevador palatino protesico definitivo",null,1,"D",99,"A","4","A"]
[14416,"D5958","Elevador palatino protesico provisional",null,1,"D",99,"A","4","A"]
[14417,"D5959","Modificacion de protesis elevador palatino",null,1,"D",99,"A","4","A"]
[14418,"D5960","Protesis laringofono con modificaciones",null,1,"D",99,"A","4","A"]
[14419,"D5982","Stent o endoprotesis quirurgica",null,1,"D",99,"A","4","A"]
[14420,"D5983","Trasmision de radiacion",null,1,"D",99,"A","4","A"]
[14421,"D5984","Blindaje contra radiacion",null,1,"D",99,"A","4","A"]
[14422,"D5985","Radiacion cono localizador",null,1,"D",99,"A","4","A"]
[14423,"D5986","Soporte de gel fluoruro",null,1,"D",99,"A","4","A"]
[14424,"D5987","Ferula de la comisura",null,1,"D",99,"A","4","A"]
[14425,"D5988","Ferula quirurgica",null,1,"D",99,"A","4","A"]
[14426,"D5999","Protesis maxilofaciales sin especificar, con informe",null,1,"D",99,"A","4","A"]
[14427,"D6010","Colocacion quirurgica del cuerpo del implante; implante endosteal",null,1,"D",99,"A","4","A"]
[14428,"D6040","Colocacion quirurgica del cuerpo del implante; implante eposteal",null,1,"D",99,"A","4","A"]
[14429,"D6050","Colocacion quirurgica: implante transostales",null,1,"D",99,"A","4","A"]
[14430,"D6053","Implante / pilar apoyo de protesis removible en arcada edentula completa",null,1,"D",99,"A","4","A"]
[14431,"D6054","Implante o pilar apoyo de protesis removible de arcada edentula parcial",null,1,"D",99,"A","4","A"]
[14432,"D6055","Implante dental apoyado en barra de conexion",null,1,"D",99,"A","4","A"]
[14433,"D6056","Pilar prefabricado - incluye colocacion",null,1,"D",99,"A","4","A"]
[14434,"D6057","Pilar personalizado - incluye la colocacion",null,1,"D",99,"A","4","A"]
[14435,"D6058","Pilar apoyado en corona de porcelana",null,1,"D",99,"A","4","A"]
[14436,"D6060","Pilar apoyado en corona de porcelana fusionada con metal (predominante de metal base)",null,1,"D",99,"A","4","A"]
[14437,"D6061","Pilar apoyado en corona de porcelana fusionada con metal resistente (metal noble)",null,1,"D",99,"A","4","A"]
[14438,"D6063","Pilar apoyado corona fundido en metal base (predominante base de metal)",null,1,"D",99,"A","4","A"]
[14439,"D6064","Pilar apoyado con corona de metal fundido de metal resistente (noble)",null,1,"D",99,"A","4","A"]
[14440,"D6094","Pilar apoyado corona de titanio",null,1,"D",99,"A","4","A"]
[14441,"D6065","Implante soportado en corona de metal",null,1,"D",99,"A","4","A"]
[14442,"D6068","Pilar apoyado en retenedor de porcelana en protesis parcial fija",null,1,"D",99,"A","4","A"]
[14443,"D6070","Pilar apoyado en retenedor de porcelana fundida de metal para protesis parcial fija (metal predominantemente base)",null,1,"D",99,"A","4","A"]
[14444,"D6071","Pilar apoyado en retenedor de porcelana fundida de metal para protesis parcial fija  metal resistente (metal noble)",null,1,"D",99,"A","4","A"]
[14445,"D6073","Pilar apoyado en retenedor para metal fundido en protesis parcial fija (metal predominantemente base)",null,1,"D",99,"A","4","A"]
[14446,"D6074","Pilar apoyado para la retencion (retenedor) de metal fundido para protesis parcial fija (metal noble)",null,1,"D",99,"A","4","A"]
[14447,"D6194","Pilar apoyado en retenedor de la corona para protesis parcial fija",null,1,"D",99,"A","4","A"]
[14448,"D6075","Implante con apoyo de retencion (retenedor) de ceramica en protesis parcial fija",null,1,"D",99,"A","4","A"]
[14449,"D6076","Implante con apoyo de retencion de porcelana fundida de metal para protesis fija",null,1,"D",99,"A","4","A"]
[14450,"D6078","Implante / pilar de apoyo para protesis fija arcada parcialmente edentula",null,1,"D",99,"A","4","A"]
[14451,"D6079","Implante / pilar de apoyo para protesis fija arcada completamente desdentada",null,1,"D",99,"A","4","A"]
[14452,"D6080","Los procedimientos de mantenimiento incluyendo la remocion de la protesis , limpieza de la protesis, limpieza de los pilares e insercion de la protesis",null,1,"D",99,"A","4","A"]
[14453,"D6090","Reparacion de cualquier parte del implante soportada en protesis, con informe",null,1,"D",99,"A","4","A"]
[14454,"D6095","Reparacion de pilar de implante , con reporte",null,1,"D",99,"A","4","A"]
[14455,"D6100","Remocion de implante , con reporte",null,1,"D",99,"A","4","A"]
[14456,"D6190","Radiografia indice de implante quirurgico. con reporte",null,1,"D",99,"A","4","A"]
[14457,"D6199","Procedimiento de implante inespecifico, con reporte.",null,1,"D",99,"A","4","A"]
[14458,"D6205","Puente de resina compuesta indirecta",null,1,"D",99,"A","4","A"]
[14459,"D6211","Puente fundido en metal predominantemente de metal base",null,1,"D",99,"A","4","A"]
[14460,"D6212","Puente fundido en metal resistente (noble)",null,1,"D",99,"A","4","A"]
[14461,"D6214","Puente de titanio",null,1,"D",99,"A","4","A"]
[14462,"D6242","Puente de porcelana fusionado con metal resistente (noble)",null,1,"D",99,"A","4","A"]
[14463,"D6245","Puente de porcelana",null,1,"D",99,"A","4","A"]
[14464,"D6251","Puente de resina con metal predominantemente de metal base",null,1,"D",99,"A","4","A"]
[14465,"D6252","Puente de resina con metal resistente (noble)",null,1,"D",99,"A","4","A"]
[14466,"D6253","Puente provisional",null,1,"D",99,"A","4","A"]
[14467,"D6710","Corona de resina compuesta indirecta",null,1,"D",99,"A","4","I"]
[14468,"D6721","Corona de resina predominantemente de metal base",null,1,"D",99,"A","4","I"]
[14469,"D6722","Corona de resina con metal resistente (noble)",null,1,"D",99,"A","4","I"]
[14470,"D6740","Corona de porcelana",null,1,"D",99,"A","4","I"]
[14471,"D6751","Corona de porcelana fusionada predominantemente metal base",null,1,"D",99,"A","4","I"]
[14472,"D6752","Corona de porcelana fusionada con metal resistente (noble)",null,1,"D",99,"A","4","I"]
[14473,"D6781","Corona 3/4 fundida predominantemente de metal base",null,1,"D",99,"A","4","I"]
[14474,"D6782","Corona 3/4 fundida de metal resistente (noble)",null,1,"D",99,"A","4","I"]
[14475,"D6783","Corona 3/4 porcelana",null,1,"D",99,"A","4","I"]
[14476,"D6791","Corona fundida completa predominantemente metal base",null,1,"D",99,"A","4","I"]
[14477,"D6792","Corona fundida completa de metal resistente (noble)",null,1,"D",99,"A","4","I"]
[14478,"D6794","Corona de titanio",null,1,"D",99,"A","4","I"]
[14479,"D6793","Corona de retencion provisional",null,1,"D",99,"A","4","I"]
[14480,"D6545","Retenedor metal fundido de resina unida a protesis fija",null,1,"D",99,"A","4","I"]
[14481,"D6548","Retenedor de porcelana para la resina unida a protesis fija",null,1,"D",99,"A","4","I"]
[14482,"D6600","Incrustacion inlay de porcelana de dos superficies",null,1,"D",99,"A","4","I"]
[14483,"D6601","Incrustacion inlay de porcelana de tres a mas superficies",null,1,"D",99,"A","4","I"]
[14484,"D6604","Incrustacion inlay fundido predominantemente de base de metal de dos superficies",null,1,"D",99,"A","4","I"]
[14485,"D6605","Incrustacion inlay fundido predominantemente de base de metal de tres a mas superficies",null,1,"D",99,"A","4","I"]
[14486,"D6624","Incrustacion inlay de titanio",null,1,"D",99,"A","4","I"]
[14487,"D6608","Incrustacion onlay de porcelana de dos superficies",null,1,"D",99,"A","4","I"]
[14488,"D6609","Incrustacion onlay de porcelana tres a mas superficies",null,1,"D",99,"A","4","I"]
[14489,"D6612","Incrustacion onlay de metal predominantemente base de dos superficies",null,1,"D",99,"A","4","I"]
[14490,"D6613","Incrustacion onlay de metal predominantemente base de tres a mas superficies",null,1,"D",99,"A","4","I"]
[14491,"D6634","Incrustacion onlay de titanio",null,1,"D",99,"A","4","I"]
[14492,"D6920","Conector en barra",null,1,"D",99,"A","4","A"]
[14493,"D6930","Re-cementado de protesis parcial fija",null,1,"D",99,"A","4","A"]
[14494,"D6940","Dispositivo dental flexible",null,1,"D",99,"A","4","A"]
[14495,"D6950","Atache de precision",null,1,"D",99,"A","4","A"]
[14496,"D6970","Poste fundido y nucleo adicional para retenedor de protesis parcial fija",null,1,"D",99,"A","4","A"]
[14497,"D6971","Poste fundido como parte del retenedor de protesis parcial fija",null,1,"D",99,"A","4","A"]
[14498,"D6972","Poste prefabricado y nucleo adicional de retenedor de protesis parcial fija",null,1,"D",99,"A","4","A"]
[14499,"D6973","Mu¤on para retenedor, incluyendo los pines",null,1,"D",99,"A","4","A"]
[14500,"D6975","Afrontamiento - metal",null,1,"D",99,"A","4","A"]
[14501,"D6976","Por cada poste fundido adicional - mismo diente",null,1,"D",99,"A","4","A"]
[14502,"D6977","Por cada poste prefabricado adicional - mismo diente",null,1,"D",99,"A","4","A"]
[14503,"D6980","Reparacion de protesis parcial fija",null,1,"D",99,"A","4","A"]
[14504,"D6985","Protesis parcial fija pediatrica",null,1,"D",99,"A","4","A"]
[14505,"D6999","Procedimiento de protesis fija sin especificar",null,1,"D",99,"A","4","A"]
[14506,"D7111","Exodoncia, remante coronal - diente deciduo",null,1,"D",99,"A","4","A"]
[14507,"D7140","Exodoncia diente erupcionado o raiz expuesta",null,1,"D",99,"A","4","A"]
[14508,"D7210","Exodoncia quirurgica del diente erupcionado que requiere elevacion del colgajo mucoperiostico, extraccion de hueso y/o seccion del diente (extraccion compleja)",null,1,"D",99,"A","4","A"]
[14509,"D7220","Exodoncia quirurgica de diente impactado en tejido blando",null,1,"D",99,"A","4","A"]
[14510,"D7230","Exodoncia quirurgica de diente parcialmente impactado oseo",null,1,"D",99,"A","4","A"]
[14511,"D7240","Exodoncia quirurgica de diente completamente impactado oseo",null,1,"D",99,"A","4","A"]
[14512,"D7241","Exodoncia quirurgica de diente retenido",null,1,"D",99,"A","4","A"]
[14513,"D7250","Extraccion quirurgica de restos radiculares",null,1,"D",99,"A","4","A"]
[14514,"D7260","Cierre de fistula oroantral",null,1,"D",99,"A","4","A"]
[14515,"D7261","Cierre primario de una perforacion sinusal",null,1,"D",99,"A","4","A"]
[14516,"D7270","Reimplantacion de diente y/o estabilizacion de diente",null,1,"D",99,"A","4","A"]
[14517,"D7272","Diente trasplante (incluye reimplantacion de un sitio a otro y entabillado y/o estabilizacion)",null,1,"D",99,"A","4","A"]
[14518,"D7280","Acceso quirurgico de diente retenido",null,1,"D",99,"A","4","A"]
[14519,"D7282","Movilizacion de diente erupcionado o en mala posicion para permitir erupcion",null,1,"D",99,"A","4","A"]
[14520,"D7283","Colocacion del dispositivo para facilitar la erupcion del diente impactado",null,1,"D",99,"A","4","A"]
[14521,"D7285","Biopsia de tejido oral - duro (hueso, dientes)",null,1,"D",99,"A","4","A"]
[14522,"D7286","Biopsia de tejido oral - tejidos blandos",null,1,"D",99,"A","4","A"]
[14523,"E7274","Biopsia de tejidos blandos extraoral",null,1,"D",99,"A","4","A"]
[14524,"E7275","Biopsia de tejidos duros extraoral",null,1,"D",99,"A","4","A"]
[14525,"D7287","Coleccion de muestra citologica exfoliativa",null,1,"D",99,"A","4","A"]
[14526,"D7288","Raspado de biopsia - recogida de muestras trans epiteliales",null,1,"D",99,"A","4","A"]
[14527,"D7290","Reposicionamiento quirurgico de los dientes",null,1,"D",99,"A","4","A"]
[14528,"D7291","Fibrotomia transeptal / supracrestal por informe",null,1,"D",99,"A","4","A"]
[14529,"D7310","Alveoloplastia con extracciones de 4 a mas dientes o espacios interdentales por cuadrante",null,1,"D",99,"A","4","A"]
[14530,"D7311","Alveoloplastia con extracciones de 1 a 3 dientes o espacios interdentales por cuadrante",null,1,"D",99,"A","4","A"]
[14531,"D7320","Alveoloplastia sin extracciones de 4 o mas dientes o espacios interdentales por cuadrante",null,1,"D",99,"A","4","A"]
[14532,"D7321","Alveoloplastia sin extracciones de 1 a 3 dientes o espacios interdentales por cuadrante",null,1,"D",99,"A","4","A"]
[14533,"D7410","Excision de lesion benigna hasta 1.25 cm",null,1,"D",99,"A","4","A"]
[14534,"D7411","Excision de lesion benigna de mas de 1.25 cm",null,1,"D",99,"A","4","A"]
[14535,"D7412","Excision de lesion benigna complicada",null,1,"D",99,"A","4","A"]
[14536,"D7413","Excision de lesion maligna 1,25 cm",null,1,"D",99,"A","4","A"]
[14537,"D7414","Excision de lesion maligna mayor que 1.25 cm",null,1,"D",99,"A","4","A"]
[14538,"D7415","Excision de lesion maligna complicada",null,1,"D",99,"A","4","A"]
[14539,"D7465","Destruccion de lesiones por el metodo fisico quimico, por informe",null,1,"D",99,"A","4","A"]
[14540,"D7440","Extirpacion de tumor maligno - diametro de lesion hasta 1,25cm",null,1,"D",99,"A","4","A"]
[14541,"D7441","Extirpacion de tumor maligno - diametro de lesion mayo de 1,25 cm",null,1,"D",99,"A","4","A"]
[14542,"D7450","Remocion de quiste o tumor odontogenico benignos - lesiones de diametro hasta 1.25 cm",null,1,"D",99,"A","4","A"]
[14543,"D7451","Remocion de quiste o tumor odontogenico benignos - lesiones de diametro de mas de 1.25 cm",null,1,"D",99,"A","4","A"]
[14544,"D7460","Remocion de quiste o tumor no odontogenico benigno - lesiones de diametro hasta 1.25 cm",null,1,"D",99,"A","4","A"]
[14545,"D7461","Remocion de quiste o tumor no odontogenico benigno - lesiones de dinametro de mas de 1.25 cm",null,1,"D",99,"A","4","A"]
[14546,"D7471","Remocion de exostosis lateral (maxila o mandibula)",null,1,"D",99,"A","4","A"]
[14547,"D7472","Eliminacion de torus palatino",null,1,"D",99,"A","4","A"]
[14548,"D7473","Eliminacion de torus mandibular",null,1,"D",99,"A","4","A"]
[14549,"D7490","Reseccion radical maxila o mandibula",null,1,"D",99,"A","4","A"]
[14551,"D7485","Reduccion quirurgica de la tuberosidad osea",null,1,"D",99,"A","4","A"]
[14553,"D7510","Incision y drenaje de absceso - intraoral",null,1,"D",99,"A","4","A"]
[14554,"D7511","Incision y drenaje de absceso - intraoral - complicado (incluye drenaje de espacios faciales multiples)",null,1,"D",99,"A","4","A"]
[14555,"D7520","Incision y drenaje de absceso - extraoral",null,1,"D",99,"A","4","A"]
[14556,"D7521","Incision y drenaje de absceso - extraoral - complicado (incluye drenaje de espacios faciales multiples)",null,1,"D",99,"A","4","A"]
[14557,"D7530","Remocion de cuerpo extra¤o de mucosa, piel o tejido alveolar subcutaneo",null,1,"D",99,"A","4","A"]
[14558,"D7540","Eliminacion de reaccion que produce cuerpos extra¤os, sistema mucoesqueletico",null,1,"D",99,"A","4","A"]
[14559,"D7550","Secuestrectomia / osteotomia parcial para remocion de hueso no vital",null,1,"D",99,"A","4","A"]
[14560,"D7560","Sinusotomia maxilar para la remocion de fragmento dental o cuerpo extra¤o",null,1,"D",99,"A","4","A"]
[14561,"D7610","Reduccion abierta en fractura simple de maxilar superior (dientes inmovilizados)",null,1,"D",99,"A","4","A"]
[14562,"D7620","Reduccion cerrada en fractura simple de maxilar superior (dientes inmovilizados)",null,1,"D",99,"A","4","A"]
[14563,"D7630","Reduccion abierta en fractura simple de mandibula (dientes inmovilizados)",null,1,"D",99,"A","4","A"]
[14564,"D7640","Reduccion cerrada en fractura simple de mandibula (dientes inmovilizados)",null,1,"D",99,"A","4","A"]
[14565,"D7650","Reduccion abierta en fractura simple de hueso malar y arco cigomatico",null,1,"D",99,"A","4","A"]
[14566,"D7660","Reduccion cerrada en fractura simple de hueso malar y/o arco cigomatico",null,1,"D",99,"A","4","A"]
[14567,"D7670","Reduccion cerrada en fractura simple de alveolo , puede incluir estabilizacion de los dientes",null,1,"D",99,"A","4","A"]
[14568,"D7671","Reduccion abierta en fractura simple de alveolos, que pueden incluir al estabilizacion de dientes",null,1,"D",99,"A","4","A"]
[14569,"D7680","Reduccion en fractura simple e los huesos faciales complicado con fijacion y multiples abordajes quirurgico",null,1,"D",99,"A","4","A"]
[14570,"D7710","Reduccion abierta en fractura complicada de maxilar",null,1,"D",99,"A","4","A"]
[14571,"D7720","Reduccion cerrada en fractura complicada de maxilar",null,1,"D",99,"A","4","A"]
[14572,"D7730","Reduccion abierta en fractura complicada de mandibula",null,1,"D",99,"A","4","A"]
[14573,"D7740","Reduccion cerrada en fractura complicada de mandibula",null,1,"D",99,"A","4","A"]
[14574,"D7750","Reduccion abierta en fractura complicada en hueso malar y/o arco cigomatico",null,1,"D",99,"A","4","A"]
[14575,"D7760","Reduccion cerrada en fractura complicada en hueso malar y/o arco cigomatico",null,1,"D",99,"A","4","A"]
[14576,"D7770","Reduccion abierta en fractura complicada de alveolos, con estabilizacion de dientes",null,1,"D",99,"A","4","A"]
[14577,"D7771","Reduccion cerrada en fractura complicada de alveolos con estabilizacion de dientes",null,1,"D",99,"A","4","A"]
[14578,"D7778","Reduccion de fractura complicada de los huesos faciales con la fijacion y multiples abordajes quirurgicos",null,1,"D",99,"A","4","A"]
[14579,"D7810","Reduccion abierta de luxacion",null,1,"D",99,"A","4","A"]
[14580,"D7820","Reduccion cerrada de luxacion",null,1,"D",99,"A","4","A"]
[14581,"D7830","Manipulacion de luxacion bajo anestesia",null,1,"D",99,"A","4","A"]
[14582,"D7840","Condilectomia",null,1,"D",99,"A","4","A"]
[14583,"D7850","Discectomia quirurgica , con / sin implante",null,1,"D",99,"A","4","A"]
[14584,"D7852","Reparacion del disco",null,1,"D",99,"A","4","A"]
[14585,"D7854","Sinovectomia",null,1,"D",99,"A","4","A"]
[14586,"D7856","Mionotomia",null,1,"D",99,"A","4","A"]
[14587,"D7858","Reconstruccion de la articulacion",null,1,"D",99,"A","4","A"]
[14588,"D7860","Artromia",null,1,"D",99,"A","4","A"]
[14589,"D7865","Artroplastia",null,1,"D",99,"A","4","A"]
[14590,"D7870","Artrocentesis",null,1,"D",99,"A","4","A"]
[14591,"D7871","Lisis y lavado artroscopico",null,1,"D",99,"A","4","A"]
[14592,"D7872","Artroscopia - diagnostico con o sin biopsia",null,1,"D",99,"A","4","A"]
[14593,"D7873","Artroscopia - quirurgico : lavado y lisis de adhesiones",null,1,"D",99,"A","4","A"]
[14594,"D7874","Artroscopia - quirurgico reposicion de disco y estabilizacion",null,1,"D",99,"A","4","A"]
[14595,"D7875","Artroscopia - quirurgico sinovectomia",null,1,"D",99,"A","4","A"]
[14596,"D7876","Artroscopia - quirurgico discectomia",null,1,"D",99,"A","4","A"]
[14597,"D7877","Artroscopia - quirurgico desbridamiento",null,1,"D",99,"A","4","A"]
[14598,"D7880","Dispositivo ortopedico oclusal, por informe",null,1,"D",99,"A","4","A"]
[14599,"D7899","Terapia no especificada tmd , por informe",null,1,"D",99,"A","4","A"]
[14600,"D7910","Sutura de las recientes heridas peque¤as de hasta 5cm",null,1,"D",99,"A","4","A"]
[14601,"D7911","Sutura complicada hasta 5 cm",null,1,"D",99,"A","4","A"]
[14602,"D7912","Sutura complicada mas de 5 cm",null,1,"D",99,"A","4","A"]
[14603,"D7920","Injerto de piel (identificar el defecto a cubrir, la ubicacion y el tipo de injerto)",null,1,"D",99,"A","4","A"]
[14604,"D7940","Osteoplastia",null,1,"D",99,"A","4","A"]
[14605,"D7941","Osteotomia - rama mandibular",null,1,"D",99,"A","4","A"]
[14606,"D7943","Osteotomia - rama mandibular con injerto oseo, incluye la obtencion del injerto",null,1,"D",99,"A","4","A"]
[14607,"D7944","Osteotomia segmento o subapical por cuadrante o sextante",null,1,"D",99,"A","4","A"]
[14608,"D7945","Osteotomia - cuerpo de la mandibula",null,1,"D",99,"A","4","A"]
[14609,"D7946","Lefort i (maxilar total)",null,1,"D",99,"A","4","A"]
[14610,"D7947","Lefort i (maxilar segmentado)",null,1,"D",99,"A","4","A"]
[14611,"D7948","Lefort ii o lefort iii (osteoplastia de los huesos faciales del tercio medio facial o hipoplasia) sin injerto oseo",null,1,"D",99,"A","4","A"]
[14612,"D7949","Lefort ii o lefort iii con injerto oseo",null,1,"D",99,"A","4","A"]
[14613,"D7950","Injerto oseo , osteoperiosteal o el cartilago de los huesos mandibulares o faciales - autogenos o no autogenos, por informe",null,1,"D",99,"A","4","A"]
[14614,"D7953","Injerto oseo de remplazo para la conservacion de la cresta",null,1,"D",99,"A","4","A"]
[14615,"D7955","Reparacion de defectos maxilofaciales de tejido blando y/o tejido duro",null,1,"D",99,"A","4","A"]
[14616,"D7960","Frenulectomia (frenectomia y frenotomia)",null,1,"D",99,"A","4","A"]
[14617,"D7963","Frenuloplastia",null,1,"D",99,"A","4","A"]
[14618,"D7970","Escision de tejido hiperplasico, por arco",null,1,"D",99,"A","4","A"]
[14619,"D7971","Escision de encia pericoronal",null,1,"D",99,"A","4","A"]
[14620,"D7972","Reduccion quirurgica de la tuberosidad fibrosa",null,1,"D",99,"A","4","A"]
[14621,"D7980","Sialolitotomia",null,1,"D",99,"A","4","A"]
[14622,"D7981","Extirpacion de la glandula salival , por informe",null,1,"D",99,"A","4","A"]
[14623,"D7982","Sialodocoplastia",null,1,"D",99,"A","4","A"]
[14624,"D7983","Cierre de fistula salival",null,1,"D",99,"A","4","A"]
[14625,"D7990","Traqueotomia de emergencia",null,1,"D",99,"A","4","A"]
[14626,"D7991","Coronoidectomia",null,1,"D",99,"A","4","A"]
[14627,"D7995","Injerto sinteticos - huesos mandibulares o faciales , por informe",null,1,"D",99,"A","4","A"]
[14628,"D7996","Implante mandibular con fines de aumento (con exclusion de cresta alveolar) mediante informe",null,1,"D",99,"A","4","A"]
[14629,"D7997","Eliminacion del aparato del implante (no por el dentista que coloco el aparato), incluye la extirpacion del arco bar",null,1,"D",99,"A","4","A"]
[14630,"E7998","Marzupielizacion del sistema estomatognatico",null,1,"D",99,"A","4","A"]
[14631,"D7999","Procedimiento quirurgico orales no especificos",null,1,"D",99,"A","4","A"]
[14632,"D8010","Tratamiento de ortodoncia limitado a la denticion primaria",null,1,"D",99,"A","4","A"]
[14633,"D8020","Tratamiento de ortodoncia limitado a la denticion de transicion",null,1,"D",99,"A","4","A"]
[14634,"D8030","Tratamiento de ortodoncia limitado a la denticion adolescente",null,1,"D",99,"A","4","A"]
[14635,"D8040","Tratamiento de ortodoncia limitado a la denticion adulta",null,1,"D",99,"A","4","A"]
[14636,"D8050","Tratamiento de ortodoncia interceptiva en denticion primaria",null,1,"D",99,"A","4","A"]
[14637,"D8060","Tratamiento de ortodoncia interceptiva en denticion mixta",null,1,"D",99,"A","4","A"]
[14638,"D8080","Tratamiento de ortodoncia integral en denticion adolescente",null,1,"D",99,"A","4","A"]
[14639,"D8090","Tratamiento de ortodoncia integral en denticion adulto",null,1,"D",99,"A","4","A"]
[14640,"D8220","Terapia con aparatologia en ortodoncia fija",null,1,"D",99,"A","4","A"]
[14641,"D8670","Controles periodicos de tratamiento ortodoncico",null,1,"D",99,"A","4","A"]
[14642,"D8680","Contencion ortodoncica",null,1,"D",99,"A","4","A"]
[14643,"D8690","Tratamiento ortodoncica realizado por otro cirujano dentista",null,1,"D",99,"A","4","A"]
[14644,"D8691","Reparacion de aparatologia ortondoncica",null,1,"D",99,"A","4","A"]
[14645,"D8692","Remplazo de retenedor perdido o fracturado",null,1,"D",99,"A","4","A"]
[14646,"D8999","Procedimiento ortodoncico no especifico",null,1,"D",99,"A","4","A"]
[14647,"D9211","Anestesia bloque regional",null,1,"D",99,"A","4","A"]
[14648,"D9212","Division del trigemino anestesia de bloqueo",null,1,"D",99,"A","4","A"]
[14649,"D9215","Anestesia local",null,1,"D",99,"A","4","A"]
[14650,"D9220","Anestesia general: primeros 30 minutos",null,1,"D",99,"A","4","A"]
[14651,"D9221","Anestesia general: primeros 15 minutos",null,1,"D",99,"A","4","A"]
[14652,"D9230","Analgesia, ansiolosis, la inhalacion de oxido nitroso",null,1,"D",99,"A","4","A"]
[14653,"D9241","Sedacion consciente intravenosa: primeros 30 minutos",null,1,"D",99,"A","4","A"]
[14654,"D9242","Sedacion consciente intravenosa: primeros 15 minutos",null,1,"D",99,"A","4","A"]
[14655,"D9248","Sedacion consciente no intravenosa",null,1,"D",99,"A","4","A"]
[14656,"D9430","Visita al consultorio para observacion ningun procedimiento realizado",null,1,"D",99,"A","4","A"]
[14657,"D9450","Presentacion del caso, planificacion del tratamiento detallado y extenso",null,1,"D",99,"A","4","A"]
[14658,"D9610","Inyeccion de drogas terapeuticas, por informe",null,1,"D",99,"A","4","A"]
[14659,"D9630","Administracion de otras drogas y/o medicamentos, por informe",null,1,"D",99,"A","4","A"]
[14660,"D9910","Aplicacion de medicamentos desensibilizantes",null,1,"D",99,"A","4","A"]
[14661,"D9911","Aplicacion de resina en sensibilidad de cuellos y raices dentarias",null,1,"D",99,"A","4","A"]
[14662,"D9920","Manejo de conducta",null,1,"D",99,"A","4","A"]
[14663,"D9930","Tratamiento de las complicaciones post quirurgicas (circunstancias inusuales), por informe",null,1,"D",99,"A","4","A"]
[14664,"D9940","Protector oclusal (ferula miorelajante)",null,1,"D",99,"A","4","A"]
[14665,"D9914","Fabricacion de protector bucal atletico",null,1,"D",99,"A","4","A"]
[14666,"D9942","Reparacion - reacondicionamiento de protector oclusal",null,1,"D",99,"A","4","A"]
[14667,"D9950","Analisis de la oclusion - montaje",null,1,"D",99,"A","4","A"]
[14668,"D9951","Ajuste oclusal limitado",null,1,"D",99,"A","4","A"]
[14669,"D9970","Microabrasion del esmalte",null,1,"D",99,"A","4","A"]
[14670,"D9971","Odontoplastia de uno a dos, incluye la eliminacion de las proyecciones del esmalte",null,1,"D",99,"A","4","A"]
[14671,"D9972","Blanqueamiento dental externo por arcada",null,1,"D",99,"A","4","A"]
[14672,"D9973","Blanqueamiento dental externo por diente",null,1,"D",99,"A","4","A"]
[14673,"D9974","Blanqueamiento interno por diente",null,1,"D",99,"A","4","A"]
[14674,"D9999","Procedimiento complementado no especificado , por informe",null,1,"D",99,"A","4","A"]
[14675,"A0141","Examen dental post morten",null,1,"D",99,"A","4","A"]
[14676,"A0142","Analisis de marca de mordida",null,1,"D",99,"A","4","A"]
[14677,"A0145","Visita de emergencia (focalizado al problema)",null,1,"D",99,"A","4","A"]
[14678,"A1331","Instruccion grupal de tecnica de higiene oral",null,1,"D",99,"A","4","A"]
[14679,"A5999","Analisis de la oclusion con pantografo",null,1,"D",99,"A","4","A"]
[14680,"A7903","Tratamiento de pericoronitis",null,1,"D",99,"A","4","A"]
[14681,"A9926","Laboratorio procedimientos medicos coadyuvante",null,1,"D",99,"A","4","I"]
[14704,"E2911","Cementacion provisional de inlay y onlay",null,1,"D",99,"A","4","A"]
[14705,"E7276","Biopsia por punzo aspiracion",null,1,"D",99,"A","4","A"]
[14706,"E8000","Tratamiento de la alveolitis seca",null,1,"D",99,"A","4","A"]
[14707,"E8001","Tratamiento de la alveolitis humeda",null,1,"D",99,"A","4","A"]
[14708,"E8002","Tratamiento de la fasceitis necrotizante cervicofacial",null,1,"D",99,"A","4","A"]
[14709,"E8211","Tratamiento de disyuncion maxilar",null,1,"D",99,"A","4","A"]
[14710,"E8212","Tratamiento de distraccion osteogenica de los maxilares",null,1,"D",99,"A","4","A"]
[14711,"59050","Monitoreo fetal","F",9,"A",55,"A","4","A"]
[14716,"97810","Acupuntura, una o mas agujas, sin estimulacion electrica, inicial de 15 minutos de contacto personal de uno-a-uno con el paciente",null,1,"M",99,"A","4","A"]
[14717,"87811","Acupuntura, una o mas agujas, sin estimulacion electrica, cada 15 minutos adicionales de contacto personal de uno-a-uno con el paciente, con la re-insercion de agujas",null,1,"M",99,"A","4","A"]
[14718,"87813","Acupuntura, una o mas agujas, con la estimulacion electrica, inicial de 15 minutos de contacto personal de uno-a-uno con el paciente",null,1,"M",99,"A","4","A"]
[14719,"87814","Acupuntura, una o mas agujas, con la estimulación electrica, cada 15 minutos adicionales de contacto personal de uno-a-uno con el paciente, con la re-insercion de agujas",null,1,"M",99,"A","4","A"]
[14720,"98925","Manipulacion osteopatica (1 - 2 regiones del cuerpo)",null,1,"D",99,"A","4","A"]
[14721,"98926","Manipulacion osteopatica (3 - 4 regiones del cuerpo)",null,1,"D",99,"A","4","A"]
[14722,"98927","Manipulacion osteopatica (5 - 6 regiones del cuerpo)",null,1,"D",99,"A","4","A"]
[14723,"98928","Manipulacion osteopatica (7 - 8 regiones del cuerpo)",null,1,"D",99,"A","4","A"]
[14724,"98929","Manipulacion osteopatica (9 - 10 regiones del cuerpo)",null,1,"D",99,"A","4","A"]
[14725,"98940","Tratamiento de manipulacion quiropractica (CMT); espinales, uno a dos regiones",null,1,"D",99,"A","4","A"]
[14726,"98941","Tratamiento de manipulacion quiropractica (CMT); espinales, de tres a cuatro regiones",null,1,"D",99,"A","4","A"]
[14727,"98942","Tratamiento de manipulacion quiropractica (CMT); espinales, cinco regiones",null,1,"D",99,"A","4","A"]
[14728,"98943","Tratamiento de manipulacion quiropractica (CMT); extraespinal, de uno a cinco regiones",null,1,"D",99,"A","4","A"]
[14729,"97140","Tecnicas de terapia manual",null,1,"D",99,"A","4","A"]
[14732,"11981","Insercion de implante","F",10,"A",60,"A","4","A"]
[14733,"11982","Remocion de implante","F",10,"A",60,"A","4","A"]
[14734,"97124","Procedimiento terapeutico de masajes",null,1,"D",99,"A","4","A"]
[14741,"90371","Inmunoglobulina de la hepatitis B (HBig), humana, para uso intravenoso",null,1,"D",99,"A","4","A"]
[14742,"97535","Terapia ocupacional",null,1,"D",99,"A","4","A"]
[14743,"97125","Técnicas de terapia Manual",null,1,"D",99,"A","4","A"]
[14744,"62273","Inyeccion, epidural, de sangre o parche de fibrina",null,1,"D",99,"A","4","A"]
[14745,"64550","Aplicacion de neuroestimulador de superficie (transcutaneo)",null,1,"D",99,"A","4","A"]
[14746,"64400","Inyeccion de agente anestesico en nervio periferico",null,1,"D",99,"A","4","A"]
[14747,"64505","Inyeccion, agente anestesico en ganglio esfenopalatino, seno carotideo o ganglio estrellado",null,1,"D",99,"A","4","A"]
[14748,"62360","Implantacion o reemplazo de dispositivo para infusion intratecal o epidural de farmacos",null,1,"D",99,"A","4","A"]
[14749,"62367","Infusion intravenosa para diagnostico o terapia, administrada por el medico o bajo su supervision directa",null,1,"D",99,"A","4","A"]
[14750,"90782","Inyeccion profilactica, diagnostica o  terapeutica; subcutanea o intramuscular",null,1,"D",99,"A","4","A"]
[14751,"90780","Infusion intravenosa para diagnostico o terapia, administrada por el médico o bajo su supervision directa",null,1,"D",99,"A","4","A"]
[14752,"C0021","Visita Comunitaria Integral",null,1,"D",99,"A","4","A"]
[14753,"C0031","Identificaci¢n de Poblaci¢n en riesgo de enfermedades con elevado impacto sanitario",null,1,"D",99,"A","4","A"]
[14754,"C3011","Organizaci¢n de Taller de Participaci¢n Comunitaria y Empoderamiento Social",null,1,"D",99,"A","4","A"]
[14755,"90716","Vacuna viva de virus de la varicela, para uso subcutáneo",null,1,"A",60,"A","4","A"]